
 GPS week: 1094   Day: 6   MJD: 51908                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2546      0     0.46    -0.62     5.09     0.00
 cod |   288     0  16308      0     0.35    -1.25     0.05    37.90
 emr |    96     0    861      1  2422.41    10.72     0.13    14.13
 esa |   288     0  16525   2133  2402.41    10.67     0.09    23.61
 igp |    96     0   2362      0     0.40    -0.32     4.57     0.00
 igu |    96     0   2453      0     0.03    -0.52     4.03     0.00
 jpl |   288     0   6870    289     5.46    -8.69     0.12     0.00
 ngs |    96     0   2546      0     0.48    -0.78     4.85     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14632     50  2422.26    10.90     0.09    24.37

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  2611   202   -34   121 42986   756   136  2680     -  -412 |
    2 | -9716   508     6  -951-15973 -5916   134 -8718     -    24 |
    3 |  3933     6  -178   319  9668  -309    38  3423     -  -286 |
    4 | -1382   142   182  -250-11028 -1648  -405 -1421     -    23 |
    5 |   634   -55     -    71-23465   687    78   594     -    14 |
    6 |  1216   154    62  -482  6844  7213   171  1153     -   115 |
    7 |  -824   112    10     X-23816   977   172  -901     -  -174 |
    8 |   292    55  -481   417 -5852  3568  -278   197     -  -459 |
    9 | -4026   -50    57   -88 -4774 -1936   -34 -5270     -   156 |
   10 | -2695    89   360     X 10849  3030   174 -3639     -  -152 |
   11 |  5882  -144   -18   470  5216  3690  -148  5643     -  -244 |
   13 |  3867   -99  -369   452  7421  2472  -391  3929     -  -274 |
   14 |  2104  -326    96   496    93  3688     -  2005     -     8 |
   17 |   -60    39   165     X     -     -    -7   621     -   -63 |
   19 | -6397   474  -296  -562-41765-11374   257 -5092     -  -151 |
   20 |  6169    33  -212    85  8586  2296  -116  6290     -  -125 |
   21 |  6187   221   180  -294  5020 14171   133  5040     -   -50 |
   22 |  8758   161  -335  -195 34026  1143   469  7844     -   -41 |
   23 | -9905   -71   -24     X     --12503    60 -8095     -   111 |
   24 | -2910     1  -101     X  1955  -159  -294 -2795     -     5 |
   25 | -5629  -178  -151   461 -1724 -8080   144 -3875     -  -171 |
   26 | -1441  -130    27     X -3465  2542  -168 -1555     -   201 |
   27 | -2782   482  -222  -674 -7449   -38   244 -2843     -   -35 |
   28 |  4722   -83   102   168 15887-13427   -43  4260     -   -45 |
   29 |  2497   -70   318     X-14737  3176   203  2372     -   108 |
   30 | -5759    14     -  -222 -1732 -3056   228 -4949     -   195 |
   31 |  3305    45  -114   456  4701  9018   -52  1950     -  -461 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -132     -   212     -     -     -     -     -     - |
 ALGO |     -   -62    20     X     -     -  -122     -     -    88 |
 AREQ |     -  -104     -    36     -     -     -     -     -   125 |
 AUCK |     -     -     -  -197     -     -     -     -     -   190 |
 BAHR |     -   -41     -  -146     -     -   158     -     -   206 |
 BRMU |     -     -     -   210     -     -     -     -     -  -204 |
 CAS1 |     -   -35     -     -     -     -     X     -     -    54 |
 CRO1 |     -   -97     -   156     -     -     1     -     -     - |
 DRAO |     -   -25     1     -     -     -     -     -     -    39 |
 FAIR |     -     -     -  -156     -     -   -78     -     -   151 |
 GODE |     -  -115     -     -     -     -     -     -     -   179 |
 GRAZ |     -    55     -   -87     -     -     -     -     -     - |
 HOB2 |     -  -179     -     -     -     -     -     -     -   278 |
 IRKT |     -    61     -   -98     -     -     -     -     -     - |
 KERG |     -    58     -     -     -     -     -     -     -   -89 |
 KIRU |     -  -200     -   322     -     -     -     -     -     - |
 KOKB |     -     -     -   364     -     -   -31     -     -  -353 |
 KOSG |     -   -87     -   140     -     -     -     -     -     - |
 KOUR |     -  -157     -   176     -     -     -     -     -    65 |
 KWJ1 |     -     -     -  -150     -     -   108     -     -   145 |
 LHAS |     -   -37     -    59     -     -     -     -     -     - |
 MAC1 |     -     2     -    -4     -     -   -56     -     -     - |
 MALI |     -     -     -  -125     -     -     -     -     -   122 |
 MATE |     -   -84     -     -     -     -     -     -     -   131 |
 MCM4 |     -     -     -   -79     -     -     -     -     -    77 |
 NRC2 |     -   -71     -   114     -     -     -     -     -     - |
 ONSA |     -  -132     -    46     -     -     -     -     -   161 |
 PERT |     -     -     -  -159     -     -     -     -     -   154 |
 PIE1 |     -     -     -    -6     -     -  -186     -     -     6 |
 POL2 |     -   192     -  -309     -     -     -     -     -     - |
 POTS |     -     3     -    -5     -     -     -     -     -     - |
 REYK |     -   -62     -    99     -     -    -7     -     -     - |
 SANT |     -  -115     -   -12     -     -   -21     -     -   224 |
 STJO |     -   -39   160    30     -     -     -     -     -     - |
 THU1 |     -   -20     -     -     -     -     -     -     -    32 |
 TSKB |     -     -     -  -135     -     -     -     -     -   131 |
 USUD |     -   -19     -    31     -     -     -     -     -     - |
 VILL |     -   108     -  -174     -     -     -     -     -     - |
 WSRT |     -   -70     -     -     -     -     -     -     -   109 |
 WTZR |     -   -68     -     2     -     -     -     -     -   104 |
 WUHN |     -    -9     -     -     -     -  -175     -     -    13 |
 YELL |     -     5   153   -38     -     -   -84     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5404    55    78    31  4545  3545    63  5486     -    65 |  288   4.09
    2 |  4082    99   160   100  2989  2595   227  3832     -   121 |  275   1.96
    3 |  3416    69   261    84  3625  2201    52  3666     -    48 |  288   2.42
    4 |  1388    86   164    89  4315  1163    57  1418     -    81 |  288   0.78
    5 |  2681    64     -    43  2155  4821    59  2502     -    72 |  288   1.67
    6 |  8776    70   203    52 10327  4637   104  8547     -    83 |  277   8.41
    7 |  1047    68   213     X  8521   764   125  1177     -   109 |  269   1.37
    8 |  3850    29   186    61  5588  2912    80  3526     -    63 |  288   3.66
    9 |  1922    41    61    79  2322  1234    92  3295     -    44 |  288   1.82
   10 |  9358    52   122     X  3651  4207    81  8325     -    77 |  277   3.51
   11 |  1153    80   142    98  2163  2497    52  1163     -    44 |  288   0.40
   13 |  1321    36   121    41  2677  1478   115  1287     -    59 |  288   0.20
   14 |   885    57    69    77  1184  1555     -   871     -    72 |  288   0.53
   17 |  9838    79    28     X     -     -   148  9285     -   122 |  275   4.53
   19 |  5738    42    58   121  7176  6003    91  6215     -    76 |  287   2.42
   20 |   940    94   107   101  1600  1021    63  1409     -    71 |  288   0.25
   21 |  4918    85    50    92  7304  7577   160  4252     -    73 |  287   2.78
   22 |  3477    36    34   101  5653   646    77  3120     -   112 |  288   0.32
   23 | 10986    35    63     X     -  2719    87  9877     -    54 |  275   5.96
   24 |  3746    54    83     X  2910  3222    65  3691     -    81 |  276   3.06
   25 |  4495    51   198    84  3250  5277    87  4581     -   115 |  288   2.36
   26 |  1172    71    57     X  1273   902   143  1020     -   108 |  262   0.66
   27 |  4425    58    37    51  5558  5001    67  4630     -   125 |  288   3.66
   28 |  7956    53    85    33  3881 11464    55  8010     -    86 |  288   1.47
   29 |   949    37     8     X  2511  1976   104  1182     -    57 |  280   0.61
   30 |  3448    35     -    51  1871  1669    51  3083     -    53 |  288   1.56
   31 |  6377    79   110    62  2732  2859    61  5130     -    83 |  282   2.64
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    47     -    75     -     -     -     -     -     - |  287   0.10
 ALGO |     -    38    60     X     -     -    52     -     -    64 |  133   0.07
 AREQ |     -    58     -    39     -     -     -     -     -    63 |  275    >>>
 AUCK |     -     -     -    55     -     -     -     -     -    54 |  288  16.49
 BAHR |     -    88     -   214     -     -   133     -     -   236 |  288   0.37
 BRMU |     -     -     -    26     -     -     -     -     -    25 |  288  17.00
 CAS1 |     -    24     -     -     -     -     X     -     -    37 |  288  10.16
 CRO1 |     -    30     -    49     -     -    64     -     -     - |  284   0.16
 DRAO |     -    25   136     -     -     -     -     -     -    50 |  279   0.09
 FAIR |     -     -     -   130     -     -    91     -     -   126 |  287   0.14
 GODE |     -    25     -     -     -     -     -     -     -    38 |  287   0.02
 GRAZ |     -    28     -    45     -     -     -     -     -     - |  287  10.65
 HOB2 |     -    24     -     -     -     -     -     -     -    37 |  288   0.05
 IRKT |     -    51     -    82     -     -     -     -     -     - |  288   0.39
 KERG |     -    32     -     -     -     -     -     -     -    50 |  285    >>>
 KIRU |     -    58     -    93     -     -     -     -     -     - |  287   2.73
 KOKB |     -     -     -    72     -     -   573     -     -    70 |  119   0.10
 KOSG |     -    32     -    51     -     -     -     -     -     - |  288 115.11
 KOUR |     -    67     -    46     -     -     -     -     -    80 |  272   3.41
 KWJ1 |     -     -     -   231     -     -   168     -     -   224 |  256  85.23
 LHAS |     -    29     -    47     -     -     -     -     -     - |  287  15.65
 MAC1 |     -   125     -   201     -     -   152     -     -     - |  241  12.62
 MALI |     -     -     -   294     -     -     -     -     -   285 |  206   3.01
 MATE |     -    26     -     -     -     -     -     -     -    41 |  287   0.12
 MCM4 |     -     -     -    47     -     -     -     -     -    46 |  282  34.63
 NRC2 |     -    30     -    48     -     -     -     -     -     - |  287   0.08
 ONSA |     -    30     -    58     -     -     -     -     -    27 |  288   0.22
 PERT |     -     -     -    69     -     -     -     -     -    67 |  288   2.22
 PIE1 |     -     -     -    41     -     -    41     -     -    40 |  288   0.06
 POL2 |     -    20     -    33     -     -     -     -     -     - |  288  19.76
 POTS |     -    27     -    43     -     -     -     -     -     - |  287  15.96
 REYK |     -    26     -    42     -     -    75     -     -     - |  288   9.14
 SANT |     -    72     -   104     -     -   125     -     -    67 |  286   8.00
 STJO |     -    27    79    37     -     -     -     -     -     - |  288   2.02
 THU1 |     -    31     -     -     -     -     -     -     -    48 |  288  16.27
 TSKB |     -     -     -    49     -     -     -     -     -    47 |  288   1.58
 USUD |     -    41     -    66     -     -     -     -     -     - |  288   0.46
 VILL |     -    28     -    45     -     -     -     -     -     - |  287   5.64
 WSRT |     -    35     -     -     -     -     -     -     -    54 |  288   0.04
 WTZR |     -    35     -    51     -     -     -     -     -    18 |  288   0.13
 WUHN |     -    43     -     -     -     -    38     -     -    67 |  286  31.84
 YELL |     -    90   168   173     -     -    93     -     -     - |  288   0.09
 -----+-------------------------------------------------------------+--------------
 TOT  |  5092    55   127    93  4571  4025   124  4854     -    90 |


 BEST CLOCK FIT: GODE   287   0.02 (ns) 

