
 GPS week: 1094   Day: 3   MJD: 51905                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2681      0     0.09    -0.03     4.86     0.00
 cod |   288     0  17747     27     0.56    -0.44     0.13    29.77
 esa |   288     0  17877   1207  2364.90    17.86     0.23    16.07
 gfz |   288     0  13745    181    -0.43     0.65     0.15    26.75
 igp |    96     0   2585      0     0.05     0.05     3.81     0.00
 igu |    96     0   2201      0     0.07     0.02     4.48     0.00
 jpl |   288     0   7579    239   -44.25    62.41     0.83     0.00
 ngs |    96     0   2681      0     0.09    -0.04     4.62     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16048    658  2384.46    17.61     0.14    27.41

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  -835   419   -12   152-31522     -  1180  -813     -  -531 |
    2 | -5403  -117   376  -136  2422 -3892   -14 -5430     -    21 |
    3 |   325   -71   412   173 14140     - -1270  -571     -  -328 |
    4 |  -526    72   -54    22 -3866  2613  -869    77     -   -56 |
    5 | -1783   -30  -144   -57-20727  6494   631 -2320     -   170 |
    6 | -1327    20  -468    84-15541 -1130  -169  -539     -   157 |
    7 | -8749    97  -158    87-16622 -7984   111 -8474     -   -85 |
    8 |  4429   241   122   139 15649-15007   345  3800     -  -426 |
    9 | -3705   -87  -295    28  1058 -6364  1292 -4068     -   230 |
   10 | -1736   184   -87   -96 12784 -9721  -761 -1898     -   -33 |
   11 |  4524    16   477    -7 10989  3178   480  4621     -  -288 |
   13 |  5493   167    91   -35 20745 14355  1081  5479     -  -170 |
   14 |  -145  -204     X   -59 -9267  5217     -   143     -   246 |
   15 |  2463    37     -    56   445 13658  1074  1377     -   -89 |
   17 | -1496   153  -458     7  7301     -   865 -1497     -   123 |
   19 |  4399   140   -29  -112 27413 10077  -626  3681     -     - |
   20 |  7545   234   218   -39  4697   290 -1134  7355     -  -315 |
   21 | -5417   166  -409   174-18403  3050  1770 -4171     -   -81 |
   22 |  9557   -13   413   -12-16048  2231  1939  9007     -  -217 |
   23 | -6760   -57  -194    25     -     -  1608 -6223     -   141 |
   24 |  2455  -142  -268   144 10273     -   -79  1512     -   129 |
   25 | -1672   -39   462   -28 -4287  4382   635 -1598     -  -163 |
   26 | -2403  -335   702  -132-12509  5690  -179 -2204     -    44 |
   27 | -9516   315   101   123 14870-18837   803 -8209     -  -468 |
   28 |  8080   -81   362   -41 14043-10429  2178  8005     -   -95 |
   29 | -1129   -41     X   191-10490  1266   781  -933     -  -150 |
   30 | -4379  -148    17   128 -8328 -5888   518 -3840     -     X |
   31 |  7641   166   543    -9 10137  6679  1178  7690     -  -456 |
 -----+-------------------------------------------------------------+
 ALGO |     -    31     X  -136     -     -    23     -     -    99 |
 ARTU |     -    19     -   -21     -     -     -     -     -     - |
 AUCK |     -    31  -213     -     -     -     -     -     -    93 |
 BAHR |     -  -107   147     -     -     -     -     -     -    31 |
 BARB |     -   323  -599     -     -     -     -     -     -     - |
 BRMU |     -     -  -256     -     -     -     -     -     -   150 |
 CAS1 |     -   -18   106   -17     -     -     -     -     -   -26 |
 COCO |     -   178     -     -     -     -   277     -     -  -193 |
 CRO1 |     -    92  -170     -     -     -     -     -     -     - |
 DAEJ |     - -1058     -     -     -     -     -     -     -  1148 |
 DAV1 |     -     8     -    -9     -     - -8493     -     -     - |
 DRAO |     -    64     -   -86     -     -     -     -     -    14 |
 EISL |     -     -   316  -190     -     -     -     -     -     - |
 FAIR |     -     -  -135     -     -     -   286     -     -    79 |
 GRAZ |     -  -202   375     -     -     -     -     -     -     - |
 GUAM |     -  -116   -73     -     -     -   360     -     -   166 |
 HOB2 |     -    -1  -214     -     -     -   256     -     -   126 |
 KERG |     -   135     -     X     -     -     -     -     -  -146 |
 KIRU |     -   158  -293     -     -     -     -     -     -     - |
 KIT3 |     -   -36   182   -70     -     -     -     -     -     - |
 KOKB |     -     -   -55    33     -     -  1121     -     -     X |
 KOSG |     -  -128   188     -     -     -   273     -     -    29 |
 KOUR |     -   -21   -59     -     -     -   -15     -     -    57 |
 KWJ1 |     -     -  -161    28     -     -   739     -     -    70 |
 LHAS |     -   -78   144     -     -     -     -     -     -     - |
 MAC1 |     -    44   -88     4     -     -     -     -     -     - |
 MALI |     -     -   100   -26     -     -  3117     -     -   -42 |
 MATE |     -   -87     -     -     -     -     -     -     -    95 |
 MCM4 |     -     -  -196   169     -     -     -     -     -   -49 |
 MKEA |     -    62  -115     -     -     -     -     -     -     - |
 NRC2 |     -   122  -227     -     -     -     -     -     -     - |
 NYA1 |     -    18     -   -20     -     -     -     -     -     - |
 PIE1 |     -    -3  -349     -     -     -     -     -     -   207 |
 POTS |     -   -51    94     -     -     -     -     -     -     - |
 REYK |     -   -18    33     -     -     -     -     -     -     - |
 SANT |     -     -  -201  -131     -     -     -     -     -   269 |
 SEY1 |     -     -   507  -305     -     -     -     -     -     - |
 THU1 |     -   -51     -     -     -     -     -     -     -    56 |
 TIDB |     -    59     X   -66     -     -     -     -     -     - |
 TRO1 |     -   -51     -    57     -     -     -     -     -     - |
 TROM |     -     -   178     -     -     -     -     -     -  -104 |
 URUM |     -   -81     -     -     -     -     -     -     -    88 |
 USNO |     -    93  -219     -     -     -     -     -     -    27 |
 USUD |     -  -119    57     -     -     -   210     -     -    96 |
 VILL |     -    47   -86     -     -     -     -     -     -     - |
 WHIT |     -    -6     -     6     -     -     -     -     -     - |
 WTZR |     -  -119   152     -     -     -     -     -     -    39 |
 WUHN |     -    28     -  -256     -     -     -     -     -   220 |
 YAR2 |     -     -    25     -     -     -     X     -     -   -15 |
 YELL |     -    32  -238   110     -     -     7     -     -     - |
 ZWEN |     -     -     -   -53     -     -     -     -     -    52 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3046   168   316    90  3760     -   505  3264     -    68 |  288   2.93
    2 |  4475    97   169   167  3348  4585   312  4443     -   197 |  288   2.25
    3 |  7813   115   224   149  2634     -  1758  7062     -   144 |  288   1.98
    4 |  3345    65   282   116  2448  3373  1135  2666     -   115 |  288   0.82
    5 |  4998    71   131    73  2873  2581   202  5392     -    82 |  288   2.36
    6 |  7849    69   138    62  7630  4878   652  8730     -    71 |  277   7.63
    7 |  1377   125   414    66  8777  2223   565  1514     -   198 |  282   1.60
    8 |  5419    96   206    86  3828  6830   203  4956     -    65 |  288   3.97
    9 |  4491   121   136   195  2835  2950   911  4338     -   146 |  288   2.38
   10 |  1998    67   225   103  3167  2539  1517  2006     -    60 |  288   1.55
   11 |  1679    60   114    47  2382  2735   195  1550     -    48 |  288   0.43
   13 |  1363   157   313   172  4382  7028   928  1415     -    93 |  288   0.24
   14 |  2543    60     X    35  2276  3093     -  2350     -    72 |  288   0.49
   15 |  7882    73     -    62  6356  5980   264  7504     -    77 |  288   4.21
   17 |  3090   114    99    85  3656     -   209  3000     -    65 |  288   2.57
   19 |  8464   199   300    97  4916  4366   959  6680     -     - |  288   3.79
   20 |  1343   114   420   104  1339  1303  1878  1434     -    85 |  288   0.18
   21 |  8294   165   294   116  3297  2938  1041  8132     -   183 |  288   2.96
   22 |  5067   123   337    48   678  2979  1214  4617     -   136 |  288   0.51
   23 |  6179    67   216    77     -     -  1006  5882     -    57 |  288   5.67
   24 |  6316   534   307   237  4365     -   513  5736     -   345 |  288   2.15
   25 |  2202    95   608   102  2032  2038   290  2423     -   194 |  288   2.03
   26 |  1995   142   105    85  1716  3618   427  1843     -    76 |  288   0.53
   27 |  6639   100   110    83  4923 10762   446  5612     -   102 |  288   2.72
   28 |  5187    81   279   188  1412  6927  1707  5190     -    65 |  288   1.54
   29 |  2624   180     X   141  1677  2709   486  2581     -   283 |  288   1.60
   30 |  2362   105   162    59  1045  1180   409  2308     -     X |  288   1.17
   31 |  2281   215   349    75  2735  2428   495  2403     -   101 |  281   2.17
 -----+-------------------------------------------------------------+--------------
 ALGO |     -    67     X    83     -     -   447     -     -    31 |  288   0.02
 ARTU |     -    28     -    31     -     -     -     -     -     - |  283  17.81
 AUCK |     -    85   131     -     -     -     -     -     -    89 |  288  20.44
 BAHR |     -   103   233     -     -     -     -     -     -   208 |  288   0.30
 BARB |     -   113   209     -     -     -     -     -     -     - |  266  28.01
 BRMU |     -     -   173     -     -     -     -     -     -   101 |  288  19.20
 CAS1 |     -   167   180    69     -     -     -     -     -   185 |  288  13.35
 COCO |     -    42     -     -     -     -   161     -     -    46 |  286  16.30
 CRO1 |     -    98   182     -     -     -     -     -     -     - |  279   0.10
 DAEJ |     -    55     -     -     -     -     -     -     -    60 |  286   1.83
 DAV1 |     -   176     -   196     -     -  1359     -     -     - |  274  14.58
 DRAO |     -    58     -    62     -     -     -     -     -    55 |  288   0.03
 EISL |     -     -   364   219     -     -     -     -     -     - |  278  42.40
 FAIR |     -     -   260     -     -     -   784     -     -   152 |  286   0.21
 GRAZ |     -    40    75     -     -     -     -     -     -     - |  287 125.07
 GUAM |     -    49   154     -     -     -   233     -     -    76 |  288  29.23
 HOB2 |     -    84   167     -     -     -   256     -     -    94 |  288   0.08
 KERG |     -    89     -     X     -     -     -     -     -    97 |  177    >>>
 KIRU |     -    69   128     -     -     -     -     -     -     - |  287   2.54
 KIT3 |     -    28    58    34     -     -     -     -     -     - |  288  22.32
 KOKB |     -     -   292   176     -     -   627     -     -     X |  273   3.66
 KOSG |     -    98    58     -     -     -   179     -     -   109 |  287  16.38
 KOUR |     -    56   174     -     -     -   568     -     -    94 |  282   3.96
 KWJ1 |     -     -   345   150     -     -   445     -     -   244 |  269  90.57
 LHAS |     -    61   113     -     -     -     -     -     -     - |  286  18.53
 MAC1 |     -    88   345   166     -     -     -     -     -     - |  237  13.22
 MALI |     -     -   247   239     -     -  1966     -     -   309 |  247   6.07
 MATE |     -    51     -     -     -     -     -     -     -    55 |  287   0.12
 MCM4 |     -     -   292    83     -     -     -     -     -   138 |  288  13.07
 MKEA |     -    62   115     -     -     -     -     -     -     - |  287  54.55
 NRC2 |     -    58   108     -     -     -     -     -     -     - |  288   0.06
 NYA1 |     -    21     -    23     -     -     -     -     -     - |  288   0.09
 PIE1 |     -   141   184     -     -     -     -     -     -    53 |  288   0.05
 POTS |     -    69   128     -     -     -     -     -     -     - |  273  15.17
 REYK |     -    52    97     -     -     -     -     -     -     - |  285   9.43
 SANT |     -     -   141   109     -     -     -     -     -   103 |  287   2.56
 SEY1 |     -     -    82    49     -     -     -     -     -     - |  103  19.16
 THU1 |     -    35     -     -     -     -     -     -     -    38 |  270  15.22
 TIDB |     -    66     X    73     -     -     -     -     -     - |  287   0.30
 TRO1 |     -   179     -   200     -     -     -     -     -     - |  285  11.29
 TROM |     -     -   104     -     -     -     -     -     -    61 |  287  13.09
 URUM |     -    73     -     -     -     -     -     -     -    80 |  287  54.83
 USNO |     -    62   137     -     -     -     -     -     -    40 |  288   0.04
 USUD |     -    61    70     -     -     -   252     -     -    87 |  288   0.63
 VILL |     -    35    65     -     -     -     -     -     -     - |  288   5.89
 WHIT |     -   179     -   199     -     -     -     -     -     - |  255   6.30
 WTZR |     -    66    57     -     -     -     -     -     -    66 |  288   0.18
 WUHN |     -    32     -    51     -     -     -     -     -    43 |  287  32.66
 YAR2 |     -     -   204     -     -     -     X     -     -   120 |  240 273.01
 YELL |     -   488   368   404     -     -   418     -     -     - |  287   0.14
 ZWEN |     -     -     -   432     -     -     -     -     -   422 |  243    >>>
 -----+-------------------------------------------------------------+--------------
 TOT  |  4864   130   231   146  3814  4479   825  4619     -   138 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

