
 GPS week: 1094   Day: 0   MJD: 51902                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2677      0     0.04    -0.01     4.15     0.00
 cod |   287     0  18521     36     0.76     0.24     0.07    32.85
 esa |   288     0  17745   1551  2338.35     8.01     0.12    18.21
 gfz |   288     0  14236    500     0.30    -0.45     0.10    23.59
 igp |    96     0   2486      0    -0.03     0.07     5.88     0.00
 igu |    96     0   2581      0    -0.05     0.06     6.06     0.00
 jpl |   288     0   7379    156    -2.75     7.40     0.35     0.00
 ngs |    96     0   2677      0     0.04    -0.01     3.96     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15309    303  2358.23     8.04     0.09    25.34

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  6665   125    64   167 12247 10849   -35  6095     -  -362 |
    2 |  4806    67  -297   242 18179 16781   165  4312     -   -97 |
    3 | -6360   -57   181    13   821  -576   171 -5728     -   -54 |
    4 | -3373    31   -60    62 -8860-10258  -304 -3160     -   -55 |
    5 | -4701   -24   310   -62-24989-26386    65 -4279     -  -134 |
    6 |  1931    31   434  -118 -2306 -3699    42  1564     -  -160 |
    7 | -5049    49     X   100-29934-31335   117 -4740     -  -157 |
    8 | -5069    36    25   166-34139-35536  -174 -4382     -  -218 |
    9 |  1946   -98   199    87 15936 14539   -88  2409     -  -101 |
   10 |  5887   255  -278   -75 36736 35338   127  5120     -   -49 |
   11 |  7244   -24    47   -38 31511 30114   140  7143     -    32 |
   13 |  6416   -26     1   -62 34466 33069  -364  5768     -    91 |
   14 |  1115   -24  -112   -10  7156  5758     -   698     -   120 |
   15 |  2582    30     -   -42 14732 13328    77  2588     -     - |
   17 |   518   112   326  -142  4994  3597  -352    57     -  -215 |
   19 | -5341   -35   242   219-25964-27362   -51 -5144     -  -335 |
   20 |  6592     3   507  -216 29689 28292    -1  6546     -  -166 |
   21 | -5857   235  -444   105  6968  5571    78 -5274     -   -81 |
   22 | -3738   211  -419    -3-86885-88283   637 -2720     -    31 |
   23 |  2168    69     X  -182     - 36600   -75  1661     -    82 |
   24 | -4767    56  -108   -61-21453-22851  -327 -4793     -    62 |
   25 | -1491    66   189  -100 10632  9235   156 -1275     -  -129 |
   26 | -1950   -64     X   -12 12002 10604  -260 -2019     -    93 |
   27 | -2881    50  -206   362 -8192 -9589    -9 -2533     -  -254 |
   28 | 12941   -78    67   -39 16644 15246    -1 11923     -    88 |
   29 | -5193  -169   332    94-12948-14346   -22 -4714     -  -112 |
   30 | -6483    59  -166   174     -     -   -26 -5981     -  -119 |
   31 |  1525    43  -100   265  2542  1150   180   916     -  -241 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -16    29     -     -     -     -     -     -     - |
 ALGO |     -   -39     X  -153     -     -   -89     -     -   193 |
 AREQ |     -   -93    82     -     -     -     -     -     -    61 |
 ARTU |     -    71     -   -98     -     -     -     -     -     - |
 AUCK |     -   -28   -50     X     -     -  -893     -     -    72 |
 BAHR |     -    76  -130   -71     -     -   -89     -     -    60 |
 BARB |     -   -91   164     -     -     -     -     -     -     - |
 BRMU |     -  -280   440     -     -     -     -     -     -    43 |
 CRO1 |     -   -99   179     -     -     -     -     -     -     - |
 DRAO |     -   -18     -     0     -     -     -     -     -    22 |
 FAIR |     -     -  -110     -     -     -    50     -     -    79 |
 FORT |     -     -  -146     -     -     -     -     -     -   105 |
 GODE |     -  -109   197     -     -     -     -     -     -     - |
 GUAM |     -     -  -100     -     -     -     3     -     -    72 |
 HOB2 |     -  -171    74    40     -     -   -56     -     -   131 |
 IISC |     -     -  -236     -     -     -     -     -     -   170 |
 KERG |     -    39     -     X     -     -     -     -     -   -50 |
 KIRU |     -   121  -218     -     -     -   253     -     -     - |
 KOKB |     -     -    42    92     -     -  -417     -     -  -139 |
 KOUR |     -  -116   210     -     -     -  -107     -     -     - |
 KWJ1 |     -     -   -44    34     -     -     -     -     -     1 |
 MAC1 |     -   -23    90   -29     -     -     -     -     -     - |
 MALI |     -     -  -313   109     -     -     -     -     -   117 |
 MATE |     -  -173     -     -     -     -     -     -     -   224 |
 MAW1 |     -    94     -  -131     -     -     -     -     -     - |
 MCM4 |     -   127  -382   -47     -     -     -     -     -   158 |
 MDO1 |     -   -27    48     -     -     -     -     -     -     - |
 MKEA |     -     -    83   -64     -     -     -     -     -     - |
 NLIB |     -  -107    63     -     -     -     -     -     -    92 |
 NRC2 |     -   -54    98     -     -     -     -     -     -     - |
 PERT |     -    43   -78     -     -     -     -     -     -     - |
 PIE1 |     -  -131   -40     -     -     -     -     -     -   196 |
 POTS |     -   117   -75  -104     -     -     -     -     -     - |
 RBAY |     -    31     -   -43     -     -     -     -     -     - |
 SANT |     -   113    50  -158     -     -  1407     -     -     X |
 THU1 |     -   -35     -     -     -     -     -     -     -    45 |
 TIDB |     -   -14     X    20     -     -     -     -     -     - |
 TSKB |     -    52  -302     -     -     -     -     -     -   154 |
 URUM |     -   -71     -   -31     -     -     -     -     -   120 |
 USNO |     -  -137   121     -     -     -     -     -     -    90 |
 USUD |     -    59  -106     -     -     -    63     -     -     - |
 VILL |     -    66  -120     -     -     -     -     -     -     - |
 WES2 |     -   107  -193     -     -     -     -     -     -     - |
 WHIT |     -   -33     -    47     -     -     -     -     -     - |
 WUHN |     -   -55     -  -150     -     -   188     -     -   211 |
 YAR2 |     -     -  -197     -     -     -     -     -     -   142 |
 YELL |     -   -73   147   -31     -     -  -197     -     -    19 |
 ZWEN |     -     -     -  -115     -     -     -     -     -   107 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3813    47   102    67  7136  6946   161  4221     -    68 |  288   3.78
    2 |  3418    76    62    87  4836  4640   195  3013     -    72 |  288   2.38
    3 |  4139    91   247    56  3261  3015   132  4287     -   195 |  288   1.63
    4 |  1549    64   226    91  4314  4644    75  1680     -   123 |  288   1.38
    5 |  3141    57    67    36  3879  4168    99  3363     -    54 |  288   2.97
    6 |  8492   143   107   184  9117  8892    84  8323     -    84 |  277   8.90
    7 |   998    85     X   102 11021 11338   154  1506     -    59 |  281   0.98
    8 |  5967    82    48   141  9372  9701   169  5614     -    36 |  288   3.41
    9 |  3829    61    98    38  3485  3214    69  3632     -    64 |  288   2.06
   10 |  4316    89   292   101  4949  4752    77  3433     -    93 |  288   2.58
   11 |  1542    63   101    64  5186  4880   141  1595     -    36 |  288   0.39
   13 |  2466    43    52    79  5720  5424   111  2168     -   123 |  288   0.21
   14 |  1341    57    40    58   904  1193     -  1349     -    53 |  288   0.67
   15 |  3921    66     -    92  5209  4939   118  3953     -     - |  286   4.16
   17 |  6195   132   327    35  4388  4137   155  6229     -    60 |  288   3.20
   19 |  2797    81    98    54  3344  3593   194  2683     -   167 |  288   2.15
   20 |   695    97   112    55  3538  3244   118   714     -   132 |  288   0.37
   21 |  4262    66    59    37  4329  4087   107  3518     -    52 |  288   2.34
   22 |  8440    72   241    28 14178 14480   155  7645     -   113 |  288   0.63
   23 |  5307    66     X   162     -  9497   112  5362     -   187 |  287   5.13
   24 |  3004   102    38   119  2809  3045   110  2901     -    46 |  288   1.99
   25 |  2350   104   116   105  2584  2423   154  2405     -   108 |  288   1.48
   26 |   812   110     X    82   786   684    78   754     -    81 |  288   0.86
   27 |  7732    83   104   105  7335  7601   220  6866     -    78 |  288   5.20
   28 |  3044    60    91   191  4381  4095   100  2652     -    86 |  288   1.17
   29 |  1541    42    42    38  3459  3746   105  1450     -    55 |  288   0.76
   30 |  2141    30    43    44     -     -   147  1869     -    52 |  288   1.28
   31 |  3069   137   151   165  3541  3414    91  3626     -    90 |  278   2.92
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    25    45     -     -     -     -     -     -     - |  287   0.07
 ALGO |     -    40     X    83     -     -    78     -     -    30 |  288   0.02
 AREQ |     -    42    67     -     -     -     -     -     -    26 |  288  19.97
 ARTU |     -    28     -    39     -     -     -     -     -     - |  287  17.63
 AUCK |     -    71    65     X     -     -  1042     -     -    73 |  288  15.57
 BAHR |     -    44    54    61     -     -   108     -     -   115 |  288   0.36
 BARB |     -    47    84     -     -     -     -     -     -     - |  262  29.83
 BRMU |     -    27    43     -     -     -     -     -     -    25 |  288  21.20
 CRO1 |     -    53    96     -     -     -     -     -     -     - |  273   0.14
 DRAO |     -    36     -    45     -     -     -     -     -    15 |  288   0.03
 FAIR |     -     -   124     -     -     -   212     -     -    89 |  283   0.17
 FORT |     -     -    92     -     -     -     -     -     -    66 |  210   0.07
 GODE |     -   128   230     -     -     -     -     -     -     - |  271   0.13
 GUAM |     -     -    96     -     -     -   105     -     -    69 |  288  31.79
 HOB2 |     -    59    80    42     -     -    60     -     -    39 |  288   0.07
 IISC |     -     -   271     -     -     -     -     -     -   195 |  244  39.34
 KERG |     -    29     -     X     -     -     -     -     -    37 |  211    >>>
 KIRU |     -    29    52     -     -     -    58     -     -     - |  284   1.97
 KOKB |     -     -   117    73     -     -   921     -     -    91 |  286   0.50
 KOUR |     -    24    44     -     -     -    60     -     -     - |  274   3.21
 KWJ1 |     -     -   160   242     -     -     -     -     -   223 |  228  84.13
 MAC1 |     -    56   166    64     -     -     -     -     -     - |  239  10.89
 MALI |     -     -   179   257     -     -     -     -     -   126 |  206  15.89
 MATE |     -    18     -     -     -     -     -     -     -    23 |  285   0.10
 MAW1 |     -    26     -    36     -     -     -     -     -     - |  287  14.68
 MCM4 |     -    42   122    64     -     -     -     -     -    28 |  288  23.14
 MDO1 |     -    15    27     -     -     -     -     -     -     - |  287  27.64
 MKEA |     -     -    16    13     -     -     -     -     -     - |  288  50.27
 NLIB |     -    51    31     -     -     -     -     -     -    49 |  288   0.03
 NRC2 |     -    25    46     -     -     -     -     -     -     - |  287   0.04
 PERT |     -    62   111     -     -     -     -     -     -     - |  279   2.12
 PIE1 |     -    20    24     -     -     -     -     -     -    26 |  288   0.03
 POTS |     -    32    60    56     -     -     -     -     -     - |  288  13.45
 RBAY |     -    30     -    42     -     -     -     -     -     - |  276 129.72
 SANT |     -   289   178   285     -     -  1363     -     -     X |  240   5.14
 THU1 |     -    27     -     -     -     -     -     -     -    35 |  284  13.83
 TIDB |     -    44     X    61     -     -     -     -     -     - |  287   0.09
 TSKB |     -    74   145     -     -     -     -     -     -    46 |  288   1.86
 URUM |     -    25     -    29     -     -     -     -     -    40 |  288  52.61
 USNO |     -    22    31     -     -     -     -     -     -    14 |  288   0.03
 USUD |     -    29    53     -     -     -   105     -     -     - |  286   0.54
 VILL |     -    20    36     -     -     -     -     -     -     - |  286   4.86
 WES2 |     -    22    40     -     -     -     -     -     -     - |  287   0.04
 WHIT |     -    21     -    29     -     -     -     -     -     - |  287   6.93
 WUHN |     -    22     -    28     -     -    66     -     -    17 |  286  24.27
 YAR2 |     -     -   100     -     -     -     -     -     -    72 |  225 661.09
 YELL |     -    27    24    30     -     -    73     -     -    37 |  288   0.08
 ZWEN |     -     -     -    44     -     -     -     -     -    41 |  277  24.37
 -----+-------------------------------------------------------------+--------------
 TOT  |  4149    69   121    98  5880  6059   350  3963     -    87 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

