
 GPS week: 1093   Day: 1   MJD: 51896                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2666      0     0.00    -0.16     5.40     0.00
 cod |   288     0  18527     49    -0.92    -3.84     0.12    23.73
 esa |   288     0  17074   1498  2273.16    11.37     0.15    18.71
 gfz |   288     0  14160    425     0.04    -1.08     0.10    30.32
 igp |    96     0   2378      0     0.02    -0.25     5.54     0.00
 igu |    96     0   2666      0     0.03    -0.24     5.52     0.00
 jpl |   288     3   7192    375    85.93     1.08     1.08     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14707    105  2290.81    11.86     0.10    27.23

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   sio   usn |
 -----+-------------------------------------------------------+
    1 |  1617   173   489    25 -1841 -1793  1321     -  -510 |
    2 |  2508    60   139   -83 26902 26950 -1226     -   -55 |
    3 | -3267   118     X   199  7184  7243  1328     -  -323 |
    4 |  -671  -111   -17   -21-13138-13090 -1528     -   130 |
    5 |  -827    92    55  -125  5285  5333  1522     -    24 |
    6 |  5854    39  -112    78 25355 25407 -1594     -   -51 |
    7 | -7079   141  -544   110-28264-28216  1657     -    37 |
    8 | -1510    92   -79   102-26913-26864 -1591     -  -139 |
    9 |  1796    95  -402    17 18304 18353  1407     -   174 |
   10 | -6865   137    64  -114-29966-29917 -1146     -   -33 |
   11 |   673  -119   423   -77  3470  3519 -1714     -  -101 |
   13 |  2635   -33   -31    22 10923 10971 -1809     -    24 |
   14 |  -835   -92  -257   -56 -8204 -8156     -     -   318 |
   15 | -3176   100     -    72     - 11540  1793     -  -164 |
   17 |  5989   179  -320   109     - -6820 -1336     -   -55 |
   19 |  4668   142     X   249-19667-19619  1237     -  -392 |
   20 |  8171   173    82  -170 17753 17802 -1451     -   -14 |
   21 |  2688   227  -294   158-11624-11575  1677     -  -172 |
   22 |  4370    49   170    56 36652 36702 -1025     -  -218 |
   23 | -1856    16  -263    74     - -6009  1608     -    86 |
   24 | -4088    75  -190    59-32662-32613 -1483     -     - |
   25 | -1133  -109   131   178-14138-14089  1450     -  -195 |
   26 |  -650  -346   462   -35-11900-11851  1110     -     6 |
   27 |  5445   117  -188   278 58395 58443 -1361     -  -278 |
   28 |  3857  -161   630  -124  3135  3183  1259     -  -157 |
   29 | -7741   -59   159    51   340   389 -1353     -   -93 |
   30 | -9660  -165   419    -8-10928-10846 -1534     -  -137 |
   31 | -1647    92   652  -102 -4410 -4373  1289     -  -380 |
 -----+-------------------------------------------------------+
 ALGO |     -  -189     X   -69     -     -   -44     -   240 |
 AREQ |     -   -40    51     -     -     -     -     -     - |
 ARTU |     -   103     -   -81     -     -     -     -     - |
 AUCK |     -    29  -229     -     -     -     -     -   132 |
 BAHR |     -   -33   -43   -74     -     -    63     -   141 |
 BARB |     -    63   -80     -     -     -     -     -     - |
 BRMU |     -     -   103     -     -     -     -     -   -71 |
 CAS1 |     -   -28    43     9     -     -  -156     -   -15 |
 CRO1 |     -   -90   114     -     -     -     -     -     - |
 DRAO |     -   -54     -   -84     -     -     -     -   141 |
 EISL |     -     -   176  -399     -     -     -     -   388 |
 FAIR |     -     -  -181     -     -     -   -44     -   124 |
 FORT |     -     -   -27     -     -     -     -     -    19 |
 GRAZ |     -   -36    46     -     -     -     -     -     - |
 GUAM |     -   285  -361     -     -     -     -     -     - |
 HOB2 |     -   -74  -230     -     -     -   -98     -   222 |
 KARR |     -    20     -   -15     -     -     -     -     - |
 KERG |     -    54     -     X     -     -     -     -   -47 |
 KIRU |     -  -142   180     -     -     -     -     -     - |
 KOKB |     -     -   137   100     -     -     X     -  -226 |
 KOUR |     -  -141   179     -     -     -  -236     -     - |
 KWJ1 |     -     -  -154   134     -     -  -727     -   -11 |
 LPGS |     -   557  -706     X     -     -     -     -     - |
 MAC1 |     -   141     -  -111     -     -     -     -     - |
 MALI |     -     -  -590     -     -     -     -     -   405 |
 MATE |     -  -141     -     -     -     -     -     -   123 |
 MAW1 |     -    90     -   -71     -     -     -     -     - |
 MCM4 |     -     -     X   -64     -     -     -     -    72 |
 NRC2 |     -  -239   303     -     -     -     -     -     - |
 NYA1 |     -    33     -   -26     -     -     -     -     - |
 ONSA |     -  -136    -2     -     -     -     -     -   119 |
 PIE1 |     -  -153  -254     -     -     -     -     -   299 |
 POTS |     -    43   -55     -     -     -     -     -     - |
 REYK |     -  -123   156     -     -     -   -14     -     - |
 SANT |     -   185   163  -159     -     -  -626     -   -84 |
 STJO |     -   -86     -    68     -     -     -     -     - |
 THU1 |     -   -78     -     -     -     -     -     -    68 |
 TIDB |     -    45     X   -35     -     -     -     -     - |
 TRO1 |     -  -169     -   132     -     -     -     -     - |
 TSKB |     -     -   -94     -     -     -     -     -    64 |
 USNO |     -  -161   -53     -     -     -     -     -   177 |
 USUD |     -    44   -47    -5     -     -     -     -     - |
 VILL |     -   -50    63     -     -     -     -     -     - |
 WHIT |     -   -22     -    17     -     -     -     -     - |
 WSRT |     -   -70     -     -     -     -     -     -    61 |
 WTZR |     -   -43  -208     -     -     -     -     -   180 |
 WUHN |     -   -13     -  -177     -     -    98     -   208 |
 YAR2 |     -     -   -97     -     -     -     -     -    67 |
 YELL |     -    50   -39   -16     -     -   -88     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  2990   122   118    87  3010  3059  1387     -    82 |  288   3.07
    2 |  4607    93   111    64  5850  5614  1227     -    99 |  288   1.89
    3 |  2999   247     X   116  2219  2165  1423     -   115 |  280   1.65
    4 |  1324   129   154    50  4585  4950  1379     -   153 |  288   0.99
    5 | 10833   114    93    77  2629  2647  1376     -    88 |  288   2.71
    6 |  8757   266   238   211 12940 12576  1530     -   124 |  278   6.63
    7 |  2047   307   241   103 11334 11675  1440     -   226 |  279   1.16
    8 |  4454    60   129   195 10080 10463  1446     -   120 |  288   4.63
    9 |  5413    79   118    70  5106  4800  1444     -    34 |  288   2.23
   10 |  4049    94   131    65  3393  3694  1457     -    80 |  288   3.02
   11 |  1731   102    81   156   694   835  1456     -    88 |  288   0.44
   13 |  2216    54    66    39   766   638  1475     -    92 |  288   0.22
   14 |  1112    71   157   132  3917  4240     -     -    88 |  288   0.47
   15 |  7401    75     -    27     -  4006  1563     -    76 |  288   2.84
   17 |  6762   108   122   119     -  5556  1442     -    26 |  288   3.08
   19 | 10864    99     X   146  6807  6596  1457     -   142 |  287   6.10
   20 |  1616   160    53   119  1782  1503  1451     -    50 |  288   0.20
   21 |  6045    80    85    46  3372  3217  1558     -    44 |  288   3.50
   22 |  5319   100   314   155  3941  3730  1452     -    94 |  287   2.23
   23 |  6974    97   153    41     -  5990  1546     -    84 |  288   6.21
   24 |  4892   149    90    88  3168  3122  1175     -     - |  288   3.17
   25 |  3265    72    45    39  3426  3556  1377     -    42 |  288   2.35
   26 |  2081    77   122    48  4020  4345  1448     -   155 |  288   0.88
   27 |  6152    61   178   124 10149  9904  1199     -    34 |  288   2.68
   28 |  2577    79   100   102   856  1164  1559     -   124 |  288   0.34
   29 |  3620    84    88    48  4250  4529  1445     -    39 |  288   0.95
   30 |  1550    56    28    61  1604  1784  1400     -    93 |  268   1.62
   31 |  8868   190    61   136  3748  3684  1452     -    57 |  276   3.19
 -----+-------------------------------------------------------+--------------
 ALGO |     -    67     X    87     -     -   109     -    62 |  288   0.02
 AREQ |     -    31    39     -     -     -     -     -     - |  288  17.49
 ARTU |     -    36     -    28     -     -     -     -     - |  283  17.65
 AUCK |     -   135    79     -     -     -     -     -    88 |  288  20.02
 BAHR |     -    64   160    53     -     -   162     -    99 |  288   0.57
 BARB |     -    26    33     -     -     -     -     -     - |  283  26.42
 BRMU |     -     -    50     -     -     -     -     -    34 |  288  24.04
 CAS1 |     -   112    67    42     -     -   146     -    23 |  288  11.06
 CRO1 |     -    48    61     -     -     -     -     -     - |  267   0.13
 DRAO |     -    88     -    62     -     -     -     -    25 |  286   0.09
 EISL |     -     -   226   155     -     -     -     -    50 |  274  38.07
 FAIR |     -     -    84     -     -     -   198     -    58 |  287   0.15
 FORT |     -     -    75     -     -     -     -     -    51 |  196   0.20
 GRAZ |     -    72    92     -     -     -     -     -     - |  275  96.23
 GUAM |     -    70    89     -     -     -     -     -     - |  244  34.06
 HOB2 |     -   107    80     -     -     -   175     -    57 |  288   0.15
 KARR |     -    54     -    42     -     -     -     -     - |  287 108.81
 KERG |     -    49     -     X     -     -     -     -    42 |  180    >>>
 KIRU |     -    66    84     -     -     -     -     -     - |  274   2.18
 KOKB |     -     -   345   192     -     -     X     -   362 |  288   0.86
 KOUR |     -    35    44     -     -     -   122     -     - |  277   7.80
 KWJ1 |     -     -   241   150     -     -   600     -   232 |  231 133.44
 LPGS |     -   391   496     X     -     -     -     -     - |  167 116.38
 MAC1 |     -    57     -    45     -     -     -     -     - |  278  14.71
 MALI |     -     -    76     -     -     -     -     -    52 |  208    >>>
 MATE |     -    24     -     -     -     -     -     -    21 |  286   0.13
 MAW1 |     -    35     -    27     -     -     -     -     - |  287  22.05
 MCM4 |     -     -     X    94     -     -     -     -   105 |  287    >>>
 NRC2 |     -   307   390     -     -     -     -     -     - |  279   0.21
 NYA1 |     -    28     -    22     -     -     -     -     - |  286   0.09
 ONSA |     -    68   113     -     -     -     -     -    52 |  288   0.43
 PIE1 |     -    41    72     -     -     -     -     -    65 |  288   0.03
 POTS |     -    53    67     -     -     -     -     -     - |  276  15.17
 REYK |     -    77    97     -     -     -   158     -     - |  288   8.22
 SANT |     -   436   246   148     -     -   447     -   163 |  252   7.08
 STJO |     -    83     -    65     -     -     -     -     - |  286   1.69
 THU1 |     -   129     -     -     -     -     -     -   113 |  272  15.45
 TIDB |     -    65     X    51     -     -     -     -     - |  287   0.37
 TRO1 |     -    49     -    38     -     -     -     -     - |  287  10.63
 TSKB |     -     -    70     -     -     -     -     -    48 |  288   1.96
 USNO |     -    99   145     -     -     -     -     -    41 |  287   0.05
 USUD |     -    50    45    44     -     -     -     -     - |  288   0.47
 VILL |     -    67    85     -     -     -     -     -     - |  287   7.82
 WHIT |     -    44     -    34     -     -     -     -     - |  264  28.88
 WSRT |     -    44     -     -     -     -     -     -    38 |  287   0.04
 WTZR |     -    31   215     -     -     -     -     -   146 |  287    >>>
 WUHN |     -    63     -    49     -     -   165     -    90 |  286  32.15
 YAR2 |     -     -    81     -     -     -     -     -    56 |  220 134.53
 YELL |     -    55   151    75     -     -   152     -     - |  287   0.07
 -----+-------------------------------------------------------+--------------
 TOT  |  5401   120   151    97  5540  5521  1077     -   104 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

