
 GPS week: 1092   Day: 3   MJD: 51891                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2668      7     0.16    -0.60     5.48     0.00
 cod |   288     0  19750      0     5.67    -7.44     0.09    29.52
 esa |   288     0  17916   1156  2226.27    15.57     0.22    12.16
 gfz |   288     0  14167      0    -0.29     1.21     0.09    32.37
 igp |    96     0   2384      0     0.20    -0.95     5.85     0.00
 igu |    96     0   2100     40    -0.37     3.06     4.48     0.00
 ngs |    96     0   2668      2     0.23    -0.96     5.21     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16286    596  2227.27    15.31     0.11    25.94

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  1809   160   651  -129 18222 -1523  1453     -  -315 |
    2 | -5778   206   463  -114 -3288 -4640 -5793     -  -304 |
    3 |   391   -66   312   157 19778 -2450   920     -  -252 |
    4 |  -187    97  -451    67-20218 -1580  -117     -   -10 |
    5 | -7850    37   287  -106 10263 -6539 -7535     -   -43 |
    6 | -2560   -51   365    61 -9002     - -2550     -  -177 |
    7 | -7531   181  -404   106-34736  7101 -7337     -  -187 |
    8 | -1636   194   446  -123 -2017     - -1687     -  -267 |
    9 |   314     8   -99    94 -6597  3891   126     -   -80 |
   10 |  9239    45   138    24 16956  7224  8345     -  -144 |
   11 |  6871    42   -95   -16 22751 -1801  6965     -    21 |
   13 |  5363    65   -67  -117 10727 -1311  5140     -   111 |
   14 |  1433  -165     -     7     -     -  1853     -   177 |
   15 | -4776    75     -    31     -     - -5628     -  -122 |
   17 | -8346   101  -234   117-40632     - -6576     -  -149 |
   19 |  5250   351  -584   139 31898  2883  4611     -  -285 |
   20 |  7109    29   917  -198 15574 -1671  7121     -  -213 |
   21 | -3134   318  -846   143-19738 -1511 -1793     -  -148 |
   22 |-12979   -13   232     5 17022-18483-12342     -   -82 |
   23 |  6331    92  -447    51     -     -  6061     -     - |
   24 |  5016   -38   117    24-10741  9309  4213     -   -41 |
   25 |  3868    -7     X   177 -6821  6733  3659     -  -213 |
   26 |  1312   -92   431     5 -8742   289  1222     -  -109 |
   27 | -5382   172   492   -49-12753 -7257 -4440     -  -355 |
   28 |  3365   -64  -793   175 17707-14379  3372     -   224 |
   29 |  -158   -71     X    64  -543  2768 -1039     -     X |
   30 | -1241   -77  -336   220  3645  3767 -1357     -   -33 |
   31 |  2856    99     X    70-10015 12109  2864     -  -195 |
 -----+-------------------------------------------------------+
 ALBH |     -    -2     5     -     -     -     -     -     - |
 ALGO |     -  -199   929  -227     -     -     -     -    74 |
 AREQ |     -   -48    98     6     -     -     -     -     - |
 ARTU |     -   132     -  -121     -     -     -     -     - |
 AUCK |     -   -14  -422     -     -     -     -     -   213 |
 BAHR |     -   -42    64   -25     -     -     -     -    48 |
 BOR1 |     -   -84   203     -     -     -     -     -     - |
 BRMU |     -   -87   121     -     -     -     -     -    42 |
 CAS1 |     -   -23    61   -35     -     -     -     -    41 |
 CRO1 |     -   -29    70     -     -     -     -     -     - |
 DAEJ |     -  -932     -     -     -     -     -     -  1060 |
 DRAO |     -    51     -  -139     -     -     -     -   116 |
 EISL |     -     -  -444  -134     -     -     -     -   372 |
 FAIR |     -     -  -196     2     -     -     -     -    82 |
 FORT |     -     -  -188     -     -     -     -     -    88 |
 GODE |     -    -3     8     -     -     -     -     -     - |
 GRAZ |     -   370  -898     -     -     -     -     -     - |
 GUAM |     -    92  -223     -     -     -     -     -     - |
 HOB2 |     -   -97   -46     -     -     -     -     -   131 |
 HRAO |     -  -112     -     -     -     -     -     -   128 |
 IISC |     -     -  -459     -     -     -     -     -   215 |
 KARR |     -    25     -   -23     -     -     -     -     - |
 KIRU |     -  -293   711     -     -     -     -     -     - |
 KOKB |     -     -     1     0     -     -     -     -     X |
 KOUR |     -   -91   221     -     -     -     -     -     - |
 KWJ1 |     -     -  -109   176     -     -     -     -  -132 |
 MAC1 |     -     9   279   -97     -     -     -     -     - |
 MALI |     -     -    28     -     -     -     -     -   -13 |
 MATE |     -   -36     -     -     -     -     -     -    41 |
 MAW1 |     -   141     -  -129     -     -     -     -     - |
 MCM4 |     -    17  -352    63     -     -     -     -    56 |
 MDO1 |     -    -6    14     -     -     -     -     -     - |
 NLIB |     -    -5  -151     -     -     -     -     -    76 |
 NRC2 |     -  -126   306     -     -     -     -     -     - |
 NYA1 |     -    60     -   -55     -     -     -     -     - |
 PIE1 |     -  -158    79     -     -     -     -     -   142 |
 POTS |     -   -35    85     -     -     -     -     -     - |
 SANT |     -     -    94    49     -     -     -     -  -135 |
 STJO |     -   -67  -132   111     -     -     -     -     - |
 SUTH |     -    65     -  -109     -     -     -     -    66 |
 THU1 |     -   -53     -     -     -     -     -     -    61 |
 TRO1 |     -  -155     -   142     -     -     -     -     - |
 TROM |     -     -   117     -     -     -     -     -   -55 |
 TSKB |     -     -  -211     -     -     -     -     -    99 |
 URUM |     -    21     -   -53     -     -     -     -    42 |
 USNO |     -   -47  -156     -     -     -     -     -   126 |
 USUD |     -    -8    19     -     -     -     -     -     - |
 VILL |     -   -19    46     -     -     -     -     -     - |
 WES2 |     -   104  -251     -     -     -     -     -     - |
 WSRT |     -    36     -     -     -     -     -     -   -41 |
 WTZR |     -   -98     -     -     -     -     -     -   112 |
 WUHN |     -   110     -  -278     -     -     -     -   223 |
 YAR2 |     -     -   -56     -     -     -     -     -    26 |
 YELL |     -    52  -173    17     -     -     -     -     - |
 ZWEN |     -     -     -    55     -     -     -     -   -69 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  3906    64   154    73  4611  2598  3836     -   103 |  288   4.07
    2 |  4249    55   281    64  3307  2670  4130     -    80 |  288   3.03
    3 |  5677   203   309   239  5571  2120  5601     -    68 |  277   2.33
    4 |  2031   148   323   114  4518  1418  1725     -    96 |  288   0.55
    5 |  2904    87   118    72  1993  6592  3091     -    63 |  288   2.08
    6 |  7756   147   265   110  8159     -  7982     -   113 |  277   8.13
    7 |  1752   201   408   171 11431  2692  1851     -   230 |  278   1.45
    8 |  4934    80   160    32  5110     -  4692     -    93 |  288   4.90
    9 |  3392    60   267    53  3460  3822  3382     -   118 |  288   2.57
   10 |  3274   105   270    80  5324  3000  3045     -    88 |  288   1.69
   11 |  1461    80   191    76  5076  1512  1495     -    87 |  288   0.59
   13 |  1026    72   157    36  2615  1099   835     -    59 |  288   0.24
   14 |  2753    69     -    69     -     -  2597     -    52 |  288   0.40
   15 |  5839    76     -   135     -     -  5277     -   116 |  288   2.89
   17 |  6478   106   217   115  6473     -  5571     -   139 |  288   4.80
   19 | 10228   122   288    95  4228  3814  9114     -   114 |  288   3.42
   20 |   921    69   246    53  1849  1042   786     -    88 |  288   0.29
   21 |  4923   111   205   145  3415  2911  4211     -   184 |  288   2.57
   22 | 16027   153   328    74 16493 13384 14765     -    67 |  288   4.06
   23 |  5318    73   407   102     -     -  5686     -     - |  279   5.82
   24 |  4518    78   306    39  3622  4850  4075     -    62 |  288   2.55
   25 |  3321    80     X   138  3564  3592  3279     -    97 |  288   1.68
   26 |  1684   222   222   100  2313  1405  1551     -    85 |  288   0.71
   27 |  5477    63   164    82  2408  2568  5774     -   110 |  288   2.32
   28 |  1852    59   156    57  2116  9121  1821     -    52 |  288   1.41
   29 |  6802   117     X   107  3263  3097  6472     -     X |  279   1.29
   30 |  2841    54   106    30  4903  2761  2719     -    45 |  288   1.95
   31 |  7433   102     X    90  7923  8161  7245     -    50 |  276   3.95
 -----+-------------------------------------------------------+--------------
 ALBH |     -    87   211     -     -     -     -     -     - |  287   0.09
 ALGO |     -   137   129    99     -     -     -     -    30 |  288   0.04
 AREQ |     -    35   167    49     -     -     -     -     - |  288  29.52
 ARTU |     -    25     -    23     -     -     -     -     - |  283  12.12
 AUCK |     -   121   213     -     -     -     -     -    95 |  288  18.47
 BAHR |     -   144   175   117     -     -     -     -    40 |  288   0.40
 BOR1 |     -    40    97     -     -     -     -     -     - |  288   2.52
 BRMU |     -   114   226     -     -     -     -     -    49 |  288  19.28
 CAS1 |     -   136   207    70     -     -     -     -    67 |  288  12.69
 CRO1 |     -    31    76     -     -     -     -     -     - |  274   0.17
 DAEJ |     -    32     -     -     -     -     -     -    36 |  276   2.84
 DRAO |     -    40     -    45     -     -     -     -    26 |  288   0.05
 EISL |     -     -   355   162     -     -     -     -   219 |  252  36.40
 FAIR |     -     -   324    97     -     -     -     -   167 |  287   0.23
 FORT |     -     -   152     -     -     -     -     -    71 |  221   0.62
 GODE |     -   169   411     -     -     -     -     -     - |  258   0.13
 GRAZ |     -    38    92     -     -     -     -     -     - |  287  60.85
 GUAM |     -    49   118     -     -     -     -     -     - |  239  30.21
 HOB2 |     -   129   197     -     -     -     -     -   121 |  288   0.09
 HRAO |     -    43     -     -     -     -     -     -    49 |  245    >>>
 IISC |     -     -   250     -     -     -     -     -   117 |  244  28.03
 KARR |     -    32     -    29     -     -     -     -     - |  222 119.52
 KIRU |     -    88   214     -     -     -     -     -     - |  286   2.09
 KOKB |     -     -   345   130     -     -     -     -     X |  243   3.13
 KOUR |     -    28    69     -     -     -     -     -     - |  276   2.02
 KWJ1 |     -     -   356   208     -     -     -     -   238 |  189 137.15
 MAC1 |     -   105   247    79     -     -     -     -     - |  280  16.87
 MALI |     -     -   300     -     -     -     -     -   140 |  248  25.28
 MATE |     -    24     -     -     -     -     -     -    27 |  287   0.14
 MAW1 |     -    20     -    19     -     -     -     -     - |  285  18.67
 MCM4 |     -    74   319    95     -     -     -     -    95 |  288   8.82
 MDO1 |     -    29    69     -     -     -     -     -     - |  288   9.13
 NLIB |     -   109   163     -     -     -     -     -    92 |  285   0.07
 NRC2 |     -    71   172     -     -     -     -     -     - |  287   0.09
 NYA1 |     -    31     -    28     -     -     -     -     - |  288   0.05
 PIE1 |     -   230    94     -     -     -     -     -   235 |  288  93.55
 POTS |     -    44   106     -     -     -     -     -     - |  288  12.50
 SANT |     -     -   303   133     -     -     -     -   285 |  272   5.28
 STJO |     -    33    98    43     -     -     -     -     - |  288   2.21
 SUTH |     -    97     -    78     -     -     -     -    33 |  288  28.82
 THU1 |     -    60     -     -     -     -     -     -    68 |  288  18.05
 TRO1 |     -    75     -    68     -     -     -     -     - |  287  10.91
 TROM |     -     -    95     -     -     -     -     -    44 |  288  13.41
 TSKB |     -     -   159     -     -     -     -     -    75 |  288   1.28
 URUM |     -    44     -    30     -     -     -     -    64 |  288  59.46
 USNO |     -    28   112     -     -     -     -     -    35 |  288   0.04
 USUD |     -    43   103     -     -     -     -     -     - |  288   0.53
 VILL |     -    31    74     -     -     -     -     -     - |  288   4.32
 WES2 |     -    72   174     -     -     -     -     -     - |  280   0.12
 WSRT |     -    41     -     -     -     -     -     -    47 |  280   0.05
 WTZR |     -    65     -     -     -     -     -     -    74 |  287   0.18
 WUHN |     -    29     -    61     -     -     -     -    52 |  287  19.24
 YAR2 |     -     -   328     -     -     -     -     -   154 |  129 144.30
 YELL |     -    41   140    26     -     -     -     -     - |  288   0.04
 ZWEN |     -     -     -    60     -     -     -     -    74 |  219    >>>
 -----+-------------------------------------------------------+--------------
 TOT  |  5475    95   223    94  5850  4477  5208     -   107 |


 BEST CLOCK FIT: ALGO   288   0.04 (ns) 

