
 GPS week: 1092   Day: 1   MJD: 51889                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2550      0    -0.09     0.00     4.58     0.00
 cod |   288     0  15286      0     3.41    -3.69     0.05    46.74
 gfz |   288     0  13534    223    -0.08    -0.32     0.08    28.91
 igp |    96     0   2382      0    -0.38     0.45     5.54     0.00
 igu |    96     0   2099      0    -0.26     0.03     4.72     0.00
 ngs |    96     0   2550      0    -0.09     0.00     4.36     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14407     80  2196.18    13.96     0.10    24.35

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   gfz   igp   igu   ngs   sio   usn |
 -----+-------------------------------------------------+
    1 | -2131   143    80 24872   571 -1293     -  -364 |
    2 | -3340   134   -35-24320  3150 -3080     -  -214 |
    3 | -2722   -96   276 10458  -531 -2151     -  -137 |
    4 | -3479   -60    38-32091  5005 -3105     -    68 |
    5 |  9365   103     9 32179     -  8226     -  -204 |
    6 | -1500    24    94 -9995 -8297 -1390     -  -156 |
    7 |  -540   153   -84-41709  -314 -1337     -  -179 |
    8 |   413   146    21-29715-16836   494     -  -294 |
    9 |   689     8    22 10925   992   738     -   -42 |
   10 |   705   129  -136  4419  2948   583     -   -74 |
   11 |  3724   -32   -42 12304  1528  3598     -   110 |
   13 |  3398   -22   -68  2354  2017  3258     -   121 |
   14 | -1984   -60     X     -     - -1580     -   115 |
   15 | -6005    19    46     --12832 -5358     -   -90 |
   17 |  6292    61   -20  2267 26303  5133     -   -91 |
   19 |  6659   151    80 -7915     -  6291     -  -379 |
   20 |  9045   100  -170 15176  4156  8815     -     6 |
   21 | -3287    78    41 27453 -8326 -3313     -  -191 |
   22 |   901    10   201 11440 -9614   908     -  -257 |
   24 | -4653    -1   -60   433  3014 -4807     -    73 |
   25 |  5171   -41   219  4226  5201  4664     -  -184 |
   26 |   855   -94   110-17536  4809   788     -    38 |
   27 | -5541    86   142 16717  1881 -4505     -  -327 |
   28 |  4903   -81    92 14718 -3211  5362     -    44 |
   29 | -3794   -14    67   101     - -3852     -   -54 |
   30 | -3839   -25   156  1196 -1979 -3780     -  -138 |
   31 |-10334     2   106-30497     --10209     -  -129 |
 -----+-------------------------------------------------+
 ALGO |     -   -63   -88     -     -     -     -   225 |
 AREQ |     -   -32    52     -     -     -     -     - |
 ARTU |     -    37   -60     -     -     -     -     - |
 AUCK |     -   -92     -     -     -     -     -   177 |
 BAHR |     -    82  -138     -     -     -     -     7 |
 BRMU |     -   -72     -     -     -     -     -   137 |
 CAS1 |     -   -54   -49     -     -     -     -   161 |
 DRAO |     -    13   -89     -     -     -     -    81 |
 EISL |     -    49  -228     -     -     -     -   188 |
 FAIR |     -     -  -277     -     -     -     -   328 |
 HOB2 |     -   -71   -25     -     -     -     -   166 |
 KERG |     -    28     -     -     -     -     -   -54 |
 KOKB |     -     -   -14     -     -     -     -    17 |
 KWJ1 |     -     -   -16     -     -     -     -    20 |
 MAC1 |     -    50   -82     -     -     -     -     - |
 MAW1 |     -    18   -30     -     -     -     -     - |
 MCM4 |     -   -35     1     -     -     -     -    85 |
 NLIB |     -   -99     -     -     -     -     -   190 |
 ONSA |     -     -  -101     -     -     -     -   120 |
 PIE1 |     -  -147     -     -     -     -     -   282 |
 POTS |     -   -50     -     -     -     -     -    96 |
 STJO |     -   -63   101     -     -     -     -     - |
 SUTH |     -   -35    56     -     -     -     -     - |
 THU1 |     -   -85     -     -     -     -     -   163 |
 TIDB |     -    56   -90     -     -     -     -     - |
 TSKB |     -   -30     -     -     -     -     -    58 |
 URUM |     -   -80   -52     -     -     -     -   212 |
 USNO |     -   -63     -     -     -     -     -   120 |
 WSRT |     -   -10     -     -     -     -     -    19 |
 WTZR |     -   -56     -     -     -     -     -   108 |
 WUHN |     -   -15  -113     -     -     -     -   163 |
 YELL |     -    -3     4     -     -     -     -     - |
 ZWEN |     -     -   -19     -     -     -     -    23 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   gfz   igp   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  5415    28   104  3762  3129  5606     -   109 |  288   3.91
    2 |  2948    53    68  3616  1522  2807     -    31 |  288   1.40
    3 |  6876   113   185  4093  3257  5359     -   102 |  274   2.53
    4 |  1442    39    28  7501  2485  1392     -    60 |  288   0.91
    5 |  7388    57    51 11320     -  6839     -    71 |  288   2.78
    6 |  8595   112    77  8782  5849  8611     -   138 |  277   7.77
    7 |  4077    76   102  9816  1002  3921     -   174 |  279   0.98
    8 |  5897    34    28 10996 10383  5882     -    51 |  288   5.82
    9 |  2243    64   163  1722  2347  2252     -   148 |  288   1.62
   10 |  2603    75    94  2648  2067  2532     -    84 |  288   2.69
   11 |   710    77    93  2045  1100   702     -    77 |  288   0.43
   13 |  1440    49    76  1109   855  1330     -    68 |  288   0.25
   14 |  2849    42     X     -     -  2866     -    81 |  213   0.53
   15 |  7376    58    53     -  3350  7275     -    51 |  288   2.47
   17 | 10005    58    62 11411 14909  8603     -    63 |  288   6.77
   19 |  4515    60   121  5115     -  4243     -   238 |  286   2.81
   20 |  1074    69   112  1775  1942  1317     -   121 |  288   0.31
   21 |  4143    68    62  3130  4317  4259     -    68 |  288   2.87
   22 |  2665    62    86  3933  4073  2715     -    87 |  288   0.56
   24 |  5255    53    35  3431  3630  5199     -    70 |  287   2.60
   25 |  3153    44    39  2184  2112  3711     -    83 |  288   2.12
   26 |   800    25    62  3639  2432   860     -    73 |  288   0.77
   27 |  3740    28    32  2167  3039  3895     -    40 |  288   2.12
   28 |  3258    90   133  1407  1536  3020     -    74 |  288   0.90
   29 |  1109    44    63  1637     -  1140     -   125 |  288   0.62
   30 |  1861    45    43  1563  1742  1891     -    70 |  288   1.44
   31 |  3702    85    76  3675     -  3550     -    95 |  277   2.35
 -----+-------------------------------------------------+--------------
 ALGO |     -    16    28     -     -     -     -    21 |  288   0.04
 AREQ |     -    28    45     -     -     -     -     - |  281    >>>
 ARTU |     -    11    18     -     -     -     -     - |  287  15.50
 AUCK |     -    29     -     -     -     -     -    56 |  284  17.38
 BAHR |     -    25    19     -     -     -     -    44 |  288   0.43
 BRMU |     -    27     -     -     -     -     -    52 |  287  15.13
 CAS1 |     -    33    46     -     -     -     -    34 |  288  14.44
 DRAO |     -    30    37     -     -     -     -    23 |  288   0.09
 EISL |     -    67    69     -     -     -     -    46 |  288  50.24
 FAIR |     -     -   121     -     -     -     -   143 |  220   0.06
 HOB2 |     -    41    31     -     -     -     -    54 |  288   0.07
 KERG |     -    38     -     -     -     -     -    72 |  287    >>>
 KOKB |     -     -   193     -     -     -     -   229 |  201   0.13
 KWJ1 |     -     -   187     -     -     -     -   222 |  225  67.95
 MAC1 |     -    31    50     -     -     -     -     - |  269  24.67
 MAW1 |     -    32    52     -     -     -     -     - |  284  19.01
 MCM4 |     -    78   114     -     -     -     -   321 |  288  12.82
 NLIB |     -    19     -     -     -     -     -    36 |  287   0.07
 ONSA |     -     -    27     -     -     -     -    32 |  288   0.12
 PIE1 |     -    25     -     -     -     -     -    49 |  287   0.07
 POTS |     -    26     -     -     -     -     -    49 |  287  13.95
 STJO |     -    12    19     -     -     -     -     - |  288   4.70
 SUTH |     -    21    35     -     -     -     -     - |  285  24.04
 THU1 |     -    63     -     -     -     -     -   120 |  254  13.61
 TIDB |     -    33    54     -     -     -     -     - |  288   0.64
 TSKB |     -    48     -     -     -     -     -    91 |  261   1.30
 URUM |     -    16    25     -     -     -     -    31 |  288  81.16
 USNO |     -    14     -     -     -     -     -    27 |  288   0.05
 WSRT |     -    46     -     -     -     -     -    88 |  288   0.07
 WTZR |     -    38     -     -     -     -     -    73 |  288   0.13
 WUHN |     -    36    50     -     -     -     -    26 |  286  29.52
 YELL |     -    21    34     -     -     -     -     - |  277   0.04
 ZWEN |     -     -   181     -     -     -     -   215 |  140    >>>
 -----+-------------------------------------------------+--------------
 TOT  |  4576    51    83  5541  4720  4359     -   102 |


 BEST CLOCK FIT: YELL   277   0.04 (ns) 

