
 GPS week: 1091   Day: 3   MJD: 51884                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2605      9    -0.03     0.22     6.56     0.00
 cod |   287     0  18423      7    -1.92     4.51     0.08    37.90
 esa |   288     0  16564   1722  2124.87     4.13     0.26    10.52
 gfz |   288     0  14417    264    -0.34     0.43     0.12    25.98
 igp |    96     0   2280      7    -0.97     0.80     6.98     0.00
 igu |    96     0   2170      0    -0.34     1.32     4.08     0.00
 ngs |    96     0   2537      0    -0.21     0.33     6.11     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15172    574  2143.11     3.86     0.11    25.61

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |    37   215  -113    98 -7128  2825  2189     -  -350 |
    2 | -4733    89   155   -10-17788  1647 -4025     -  -173 |
    3 |  5351   -52   392   196 -4449  2585  4443     -  -243 |
    4 | -8166   -67   318  -135-38460  3116 -7580     -   111 |
    5 | -2903    92    74  -138 -4244    88 -3260     -   -16 |
    6 |-10734    -8   220   -48  3558 -6135 -9678     -   -25 |
    7 | -4011    92  -436   -15-35198 -7522 -3949     -    24 |
    8 |  5687   224  -112    -9 16880 -1510  5230     -  -242 |
    9 |  1014   -87   245   -11  2398  5414   756     -    26 |
   10 | -8548    42  -130    10-16753 -4639 -7351     -   -16 |
   11 | -2917   -27   103   -17 -4040 -4565 -2014     -    12 |
   13 |  2648   -41    -7    72 -3268 -1376  2968     -   -14 |
   14 |  4318  -167     -     -     -     -     -     -   247 |
   15 |  2918    93     -     8   883     -  3134     -  -135 |
   17 | -2390   -29     X     -     -  7206 -2967     -    42 |
   19 |   324    84    -8   282 10989     -  1643     -  -394 |
   20 |  6686   122   -12  -135 13612 -2040  6723     -   -27 |
   21 |  4023   288  -598   -29 12189  1574  3216     -  -108 |
   22 | 11565   133   245     9147905  1178 10616     -  -267 |
   23 |  2507   -28     X    41     -     -  2299     -     - |
   24 |  -878    -7   -81   -67 -3976  3975 -1346     -   109 |
   25 |  4866    30   -35   125-11526  9156  4280     -  -154 |
   26 |  -237  -193     X   151-15374 -6558  -404     -   104 |
   27 |  2574    56   107   156 -9925  6160  2767     -  -275 |
   28 | -2856    -9    14   119-10827 -4325 -1909     -  -114 |
   29 |  3383    23  -231    55     -     -  3482     -     9 |
   30 | -2100   -17   418     7 -4730 -2521 -2178     -  -146 |
   31 | -6250    97   -61   206-10472 -3006 -7712     -  -318 |
 -----+-------------------------------------------------------+
 ALGO |     -   -95     X   -79     -     -     -     -   220 |
 AREQ |     -  -129     9    -2     -     -     -     -   185 |
 ARTU |     -   -22     -    33     -     -     -     -     - |
 ASC1 |     -    21    61  -201     -     -     -     -   159 |
 AUCK |     -   -46   -19     -     -     -     -     -    76 |
 BAHR |     -    65  -199   -97     -     -     -     -    83 |
 BARB |     -   -32   115     -     -     -     -     -     - |
 BRMU |     -  -146   212     -     -     -     -     -   125 |
 CAS1 |     -   -84   255   -90     -     -     -     -   110 |
 CRO1 |     -   -69   250     -     -     -     -     -     - |
 DRAO |     -     7     -  -182     -     -     -     -   175 |
 FAIR |     -     -  -174     -     -     -     -     -    71 |
 FORT |     -     -    90     -     -     -     -     -   -37 |
 GRAZ |     -    69  -247     -     -     -     -     -     - |
 GUAM |     -    63   -97     -     -     -     -     -   -79 |
 HOB2 |     -  -151   271    41     -     -     -     -    69 |
 KERG |     -   -25     -     X     -     -     -     -    38 |
 KIRU |     -    17   -61     -     -     -     -     -     - |
 KOKB |     -     -   232   -94     -     -     -     -     X |
 KOSG |     -   -74  -219     -     -     -     -     -   199 |
 KOUR |     -  -119   427     -     -     -     -     -     - |
 KWJ1 |     -     -    72    -1     -     -     -     -   -27 |
 MAC1 |     -    38   162  -116     -     -     -     -     - |
 MALI |     -     -   -91     -     -     -     -     -    38 |
 MATE |     -   -80     -     -     -     -     -     -   118 |
 MCM4 |     -    49   340   125     -     -     -     -  -327 |
 MKEA |     -     -   195   -79     -     -     -     -     - |
 NLIB |     -   -98     -     -     -     -     -     -   145 |
 NRC2 |     -   237  -852     -     -     -     -     -     - |
 NYA1 |     -    48     -   -70     -     -     -     -     - |
 ONSA |     -   -78   -91  -107     -     -     -     -   261 |
 PIE1 |     -  -157  -110     -     -     -     -     -   276 |
 REYK |     -    -7    24     -     -     -     -     -     - |
 SANT |     -     -    44   -18     -     -     -     -     X |
 STJO |     -    -9     -    14     -     -     -     -     - |
 SUTH |     -   -24     -    35     -     -     -     -     - |
 THTI |     -   -40     -     -     -     -     -     -    60 |
 THU1 |     -   -61     -     -     -     -     -     -    90 |
 TIDB |     -    48     X   -70     -     -     -     -     - |
 TIXI |     -    82     -  -119     -     -     -     -     - |
 TRO1 |     -   -89     -   130     -     -     -     -     - |
 TSKB |     -    21  -271     -     -     -     -     -    81 |
 USNO |     -   -37  -243     -     -     -     -     -   154 |
 USUD |     -     9   -56    10     -     -     -     -     - |
 VILL |     -    42  -150     -     -     -     -     -     - |
 WHIT |     -    44     -   -64     -     -     -     -     - |
 WTZR |     -   -11  -260   -64     -     -     -     -   189 |
 YAR2 |     -     -   188     -     -     -     -     -   -77 |
 YSSK |     -   -51     -    74     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 | 13337    51   346   119  5316  5468 10841     -    51 |  288   3.48
    2 |  3347    77   366   169  3114  2344  3491     -    60 |  288   1.81
    3 |  4948   138   470   172  2274  2987  4887     -    80 |  276   1.41
    4 |  1676    68   430    65 10011  1595  1903     -    76 |  288   1.45
    5 |  5779    44   192    93  3178  4097  5681     -   128 |  288   3.23
    6 |  8109   197   258   181  8254  5495  6888     -   123 |  278   7.02
    7 |  1634   127   504    96 10445  2672  1698     -    99 |  278   2.27
    8 |  6807    63   369    71  7493  4935  6777     -    84 |  285   5.82
    9 |  2058    99   215    90  3727  3381  2195     -    76 |  288   1.71
   10 |  3432    88   285    90  4533  3959  3644     -   119 |  277   1.52
   11 |  3388    65   157    46  3398  2410  3126     -    75 |  288   0.40
   13 |   944    51   142    50  2530  1297  1061     -    66 |  288   0.47
   14 |  1411    65     -     -     -     -     -     -    96 |  205    >>>
   15 |  6240    44     -    65  5997     -  5812     -    86 |  287   1.97
   17 | 14906   131     X     -     -  4826 14427     -   194 |  240   4.49
   19 | 11907    89    73    74  7083     - 10213     -    69 |  287   4.00
   20 |   958   151   105   135  2330  1313   951     -   280 |  288   0.27
   21 |  5224   173   105   103  4476  3505  5506     -   238 |  277   3.05
   22 |  5092   210   371   149 20406  2721  5127     -    76 |  288   3.01
   23 |  6432    62     X    91     -     -  6642     -     - |  244   6.46
   24 |  2911    54   317    48  4209  3108  2598     -    99 |  287   1.70
   25 |  5784    50   227    61  6443  7627  4943     -    55 |  288   3.48
   26 |  2172    85     X   133  5744  3019  1952     -    99 |  288   0.77
   27 |  7276    50   189   119  7276  8392  7245     -    62 |  288   4.27
   28 |  5482    62   367    57  6445  1534  5320     -   139 |  288   0.51
   29 |  1540    63   312    88     -     -  1718     -   131 |  288   1.28
   30 |  2258    34   345   106  3047  1127  2105     -    40 |  288   1.55
   31 | 14327    85   216    54  6438  5738 12899     -    72 |  277   2.10
 -----+-------------------------------------------------------+--------------
 ALGO |     -    23     X    30     -     -     -     -    23 |  288   0.04
 AREQ |     -    43   128    60     -     -     -     -    55 |  288  27.85
 ARTU |     -    29     -    43     -     -     -     -     - |  287  16.48
 ASC1 |     -   113   310    56     -     -     -     -    57 |  208    >>>
 AUCK |     -    41   212     -     -     -     -     -    72 |  288  17.87
 BAHR |     -   235   323   573     -     -     -     -   179 |  286   0.40
 BARB |     -    56   201     -     -     -     -     -     - |  276  23.68
 BRMU |     -    52   141     -     -     -     -     -    36 |  288  18.95
 CAS1 |     -    26   267   102     -     -     -     -    30 |  288  12.82
 CRO1 |     -    33   118     -     -     -     -     -     - |  274   0.15
 DRAO |     -    84     -   106     -     -     -     -    39 |  286    >>>
 FAIR |     -     -   430     -     -     -     -     -   177 |  227   0.42
 FORT |     -     -   117     -     -     -     -     -    48 |  187   1.21
 GRAZ |     -    78   282     -     -     -     -     -     - |  285  81.97
 GUAM |     -   167   415     -     -     -     -     -   199 |  218  23.09
 HOB2 |     -    40   245    73     -     -     -     -    62 |  288   0.10
 KERG |     -    39     -     X     -     -     -     -    58 |  261    >>>
 KIRU |     -    47   170     -     -     -     -     -     - |  286   2.38
 KOKB |     -     -   265   107     -     -     -     -     X |  236   2.46
 KOSG |     -    25   121     -     -     -     -     -    41 |  288  14.88
 KOUR |     -    48   171     -     -     -     -     -     - |  255   8.97
 KWJ1 |     -     -   328   146     -     -     -     -   195 |  243 118.96
 MAC1 |     -    43   250    74     -     -     -     -     - |  280  22.91
 MALI |     -     -   236     -     -     -     -     -    97 |  259  31.72
 MATE |     -    22     -     -     -     -     -     -    32 |  285   0.15
 MCM4 |     -   108   322    85     -     -     -     -   320 |  288   9.92
 MKEA |     -     -   163    66     -     -     -     -     - |  288  37.31
 NLIB |     -    31     -     -     -     -     -     -    46 |  286   0.08
 NRC2 |     -    36   129     -     -     -     -     -     - |  281   0.05
 NYA1 |     -    16     -    23     -     -     -     -     - |  287   0.10
 ONSA |     -    30   157    92     -     -     -     -    38 |  288   0.15
 PIE1 |     -    78   371     -     -     -     -     -    53 |  288   0.08
 REYK |     -    23    83     -     -     -     -     -     - |  285   8.54
 SANT |     -     -   251   102     -     -     -     -     X |  251   3.67
 STJO |     -    26     -    38     -     -     -     -     - |  285   2.22
 SUTH |     -    63     -    92     -     -     -     -     - |  234  27.40
 THTI |     -    98     -     -     -     -     -     -   146 |  196   9.06
 THU1 |     -    63     -     -     -     -     -     -    93 |  284  15.06
 TIDB |     -    39     X    57     -     -     -     -     - |  287   0.22
 TIXI |     -    16     -    24     -     -     -     -     - |  280  14.95
 TRO1 |     -    20     -    29     -     -     -     -     - |  285  11.50
 TSKB |     -    52   159     -     -     -     -     -    56 |  288   1.56
 USNO |     -    54   203     -     -     -     -     -    29 |  286   0.04
 USUD |     -    35   175    45     -     -     -     -     - |  288   0.59
 VILL |     -    15    53     -     -     -     -     -     - |  287   4.51
 WHIT |     -    47     -    69     -     -     -     -     - |  276  14.32
 WTZR |     -    44   232    52     -     -     -     -    25 |  288   0.23
 YAR2 |     -     -   250     -     -     -     -     -   103 |  152 391.87
 YSSK |     -    20     -    28     -     -     -     -     - |  279  22.45
 -----+-------------------------------------------------------+--------------
 TOT  |  6562    80   259   120  6975  4081  6114     -   112 |


 BEST CLOCK FIT: ALGO   288   0.04 (ns) 

