
 GPS week: 1091   Day: 1   MJD: 51882                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2521      0    -0.03     0.04     5.76     0.00
 cod |   288     0  17030      0     3.39    -5.39     0.09    30.63
 esa |   288     0  16140   1733  2108.43     2.64     0.21    12.05
 gfz |   288     0  13373    125     0.27    -1.04     0.08    35.73
 igp |    96     0   2428      0    -0.24     0.35     6.94     0.00
 igu |    96     0   2048      9     0.25    -0.83     6.33     0.00
 usn |   288     0  14319    199  2125.30     3.76     0.12    21.59

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   usn |
 -----+-------------------------------------------+
    1 | -6449   289  -206   -84  -445-11122  -157 |
    2 | -6976    67    28    17 -8368-10186  -135 |
    3 |   600   -65   614    50 11504     -  -265 |
    4 | -4938   -86   -61   -27 -9530  8446   197 |
    5 |  3333   170   122   -91 31570     -  -148 |
    6 | -5439     1   277    39 20405 -8144  -188 |
    7 | -5912    91  -274     2-42334 -3229    17 |
    8 |  7425   146   -75     8 12476-24868  -168 |
    9 |  4265   -45  -116    83 31021 13558   -15 |
   10 | -1016    80     X   -82  4123  -538    24 |
   11 |  4179   -33   381  -132 28583 -1539    49 |
   13 |  1491     1  -411   -57  9093  2244   322 |
   15 | -7923   178     -     1 11239  3099  -243 |
   17 |-15244   100     X    12-38429     -  -157 |
   19 |  9267    91  -449    77 20984     -     - |
   20 |  5582   199    78  -267 14469  4092   110 |
   21 |  7784   158     X   165 30625  7160  -487 |
   22 | 14849    31   374    39****** 30560  -309 |
   23 |  4433    80   -67   -58     -     -    21 |
   24 | -8382   -58  -185   -18 36324-16634   214 |
   25 | -3766   -45     X   152   -71   303  -188 |
   26 |   312  -220    38    97  8858 -6779   123 |
   27 |  4029   109  -154   180 20958  4661  -373 |
   28 |  6208   -70  -235    62 -5501  5621   127 |
   29 |  1712     -   579     - -1532  9501  -323 |
   30 | -2056    30  -193   138  1614  -313  -164 |
   31 | -6757    11   414   -15  -996  1579  -207 |
 -----+-------------------------------------------+
 ALGO |     -     3     X   -59     -     -    93 |
 ARTU |     -    90     -   -77     -     -     - |
 ASC1 |     -  -229   286    83     -     -    15 |
 AUCK |     -     1  -180     -     -     -    99 |
 BAHR |     -  -138   -51     -     -     -   141 |
 BARB |     -    -9    23     -     -     -     - |
 BRMU |     -     -   355     -     -     -  -198 |
 CAS1 |     -    22    72   -63     -     -    38 |
 CHAT |     -   -23    59     -     -     -     - |
 DRAO |     -     4     -   -37     -     -    56 |
 EISL |     -     -  -708    37     -     -   319 |
 FAIR |     -     -  -823     -     -     -   459 |
 FORT |     -     -  -172     -     -     -    96 |
 HOB2 |     -   -32   -56   -27     -     -   120 |
 KERG |     -    17     -     -     -     -   -25 |
 KIRU |     -  -216   549     -     -     -     - |
 KOKB |     -     -  -324   136     -     -   -38 |
 KOSG |     -  -143   365     -     -     -     - |
 KOUR |     -   -69   175     -     -     -     - |
 KWJ1 |     -     -    78  -212     -     -   389 |
 LPGS |     -   227  -576     X     -     -     - |
 MAC1 |     -    70   -38   -49     -     -     - |
 MALI |     -     -  -110     -     -     -    61 |
 MATE |     -   -92     -     -     -     -   130 |
 MAW1 |     -    89     -   -76     -     -     - |
 MCM4 |     -     -  -373    65     -     -    94 |
 MDO1 |     -   -72   183     -     -     -     - |
 NRC2 |     -   -37    95     -     -     -     - |
 NYA1 |     -    41     -   -35     -     -     - |
 ONSA |     -    22   264  -108     -     -     - |
 PIE1 |     -  -149   -34     -     -     -   230 |
 POTS |     -   -30    77     -     -     -     - |
 REYK |     -   -55   140     -     -     -     - |
 SANT |     -     -    84    96     -     -  -268 |
 STJO |     -   -13     -    11     -     -     - |
 SUTH |     -    42     -   -36     -     -     - |
 THU1 |     -   -79     -     -     -     -   112 |
 TRO1 |     -  -188     -   161     -     -     - |
 TROM |     -     -   140     -     -     -   -78 |
 TSKB |     -     -  -513     -     -     -   286 |
 URUM |     -   -47     -   -73     -     -   179 |
 USNO |     -   -27    46     -     -     -    11 |
 USUD |     -    53  -135     -     -     -     - |
 VILL |     -    12   -31     -     -     -     - |
 WHIT |     -   -29     -    24     -     -     - |
 WSRT |     -   -89     -     -     -     -   126 |
 WTZR |     -  -143   254     -     -     -    60 |
 WUHN |     -     -     -    33     -     -   -54 |
 YAR2 |     -     -  -352     -     -     -   197 |
 YSSK |     -   118     -  -101     -     -     - |
 -----+-------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   usn | NEPO RMS (ns)
 -----+-------------------------------------------+--------------
    1 |  9810    81   185    23  4804  4867   181 |  288   4.63
    2 |  9707    80   165   123  3538  3482    80 |  288   3.81
    3 |  8880   102   251    75  4203     -   106 |  276   2.01
    4 |  1809   117   152    73  3694  4480    37 |  288   1.08
    5 |  5720   101   280    61  7768     -   113 |  288   2.35
    6 | 12181   119   233    59  9753  3288   125 |  277   7.76
    7 |  1011   111   292    50 11863  2454   158 |  278   0.78
    8 |  4425    65   208    57  4058 17993    71 |  288   4.21
    9 |  2589    63   218    57  7434  5308    49 |  288   2.52
   10 |  1925   182     X    96  2929  1371   108 |  277   1.63
   11 |  1720    57   157   129  3597  1788   164 |  288   0.40
   13 |  1387    43   261    48   987  1614    90 |  288   0.19
   15 |  4471   175     -   105  3261  3413   171 |  284   2.66
   17 |  3029    62     X    57  6406     -    49 |  288   2.61
   19 |  5849    81   217    47 13335     -     - |  288   3.94
   20 |  1018    84   254    86   938  1577   147 |  288   0.22
   21 |  8533   174     X   112  3679  1908   143 |  276   1.64
   22 | 11070   142   270   102 21668 18898    65 |  288   0.83
   23 |  8838   308   275   173     -     -   243 |  277   5.05
   24 |  3283   114   169    93  4724  5326    74 |  288   1.43
   25 |  2218   132     X    49  1668  2176   171 |  288   1.33
   26 |  2093    37   139    28  1293  3764    56 |  288   0.88
   27 |  2856   103   318   137  3116  2556   162 |  284   2.58
   28 |   926    93   223    88  2450  2657    75 |  288   0.61
   29 |  2791     -   325     -  3681  4275   181 |  158   3.08
   30 |  2305    73   285    53  2859  1973   125 |  288   1.78
   31 |  5468   112   185    61  3823  3511    59 |  278   2.98
 -----+-------------------------------------------+--------------
 ALGO |     -    40     X    38     -     -    26 |  288   0.03
 ARTU |     -    28     -    24     -     -     - |  282  20.60
 ASC1 |     -    47   253    71     -     -   201 |  233 944.54
 AUCK |     -    47   165     -     -     -    42 |  288  18.20
 BAHR |     -   166   360     -     -     -   212 |  283   0.38
 BARB |     -    78   199     -     -     -     - |  261  23.50
 BRMU |     -     -   180     -     -     -   101 |  288  19.96
 CAS1 |     -    87   221    55     -     -    37 |  288  11.82
 CHAT |     -    58   147     -     -     -     - |  282  23.05
 DRAO |     -    85     -    48     -     -    63 |  288   0.05
 EISL |     -     -   264    74     -     -    99 |  243  42.95
 FAIR |     -     -    81     -     -     -    45 |  153   0.23
 FORT |     -     -   195     -     -     -   109 |  198   0.45
 HOB2 |     -    79   183    36     -     -    50 |  288   0.13
 KERG |     -    21     -     -     -     -    30 |  266    >>>
 KIRU |     -    39    98     -     -     -     - |  259   1.54
 KOKB |     -     -   165   121     -     -   173 |  286   2.51
 KOSG |     -    38    97     -     -     -     - |  288  54.38
 KOUR |     -   110   279     -     -     -     - |  256   2.45
 KWJ1 |     -     -   271    90     -     -   174 |  223  93.07
 LPGS |     -    68   172     X     -     -     - |  125  15.36
 MAC1 |     -    77   291    75     -     -     - |  275  17.94
 MALI |     -     -   481     -     -     -   269 |  167  16.20
 MATE |     -    14     -     -     -     -    20 |  283   0.06
 MAW1 |     -    29     -    25     -     -     - |  280  29.13
 MCM4 |     -     -   243   197     -     -   217 |  284  42.91
 MDO1 |     -   109   278     -     -     -     - |  276  56.04
 NRC2 |     -    83   210     -     -     -     - |  288   0.05
 NYA1 |     -    30     -    26     -     -     - |  288   0.12
 ONSA |     -    51    78    52     -     -     - |  288  15.02
 PIE1 |     -    35   178     -     -     -   118 |  288   0.04
 POTS |     -    18    47     -     -     -     - |  284  13.33
 REYK |     -    31    78     -     -     -     - |  284   8.12
 SANT |     -     -   252   111     -     -   237 |  271  12.36
 STJO |     -    39     -    33     -     -     - |  284   3.00
 SUTH |     -    86     -    74     -     -     - |  283  23.83
 THU1 |     -    43     -     -     -     -    62 |  283  16.16
 TRO1 |     -    31     -    26     -     -     - |  282  11.46
 TROM |     -     -   135     -     -     -    75 |  288  14.93
 TSKB |     -     -   143     -     -     -    80 |  236   1.56
 URUM |     -    34     -    18     -     -    32 |  288  53.60
 USNO |     -    87   209     -     -     -    38 |  288  78.89
 USUD |     -    33    83     -     -     -     - |  266   0.52
 VILL |     -    27    68     -     -     -     - |  284   7.84
 WHIT |     -    65     -    56     -     -     - |  288   6.79
 WSRT |     -    27     -     -     -     -    38 |  288   0.06
 WTZR |     -    48    58     -     -     -    54 |  288   0.10
 WUHN |     -     -     -    17     -     -    28 |   79  15.54
 YAR2 |     -     -   146     -     -     -    81 |  116  10.73
 YSSK |     -    58     -    50     -     -     - |  275  23.74
 -----+-------------------------------------------+--------------
 TOT  |  5756    90   214    80  6944  6326   120 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

