
 GPS week: 1090   Day: 4   MJD: 51878                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2545      0     0.02     0.04     4.33     0.00
 cod |   287     0  14453      0    -0.31     2.30     0.07    39.01
 esa |   288     0  11511   8444   296.25    55.74     3.91     0.00
 gfz |   288     0  13265      0    -0.53     0.69     0.09    32.43
 igp |    96     0   2473      0    -0.04     0.13     4.42     0.00
 igu |    96     0   1902      0    -0.04     0.07     3.59     0.00
 usn |   288     0  13003      0  2086.00    10.30     0.11    28.55

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   usn |
 -----+-------------------------------------------+
    1 | -1506   292  2984   -35 27886  -637  -354 |
    2 |  5841   112  1943   -11 10889  4130  -137 |
    3 |  2586  -169     X   240 14656  7074   -54 |
    4 | -3385   -84     X    42-10317 -6252    64 |
    5 |  3584    63     X   -84 -6329     -    12 |
    6 |  2704    11  2825    81  8622     -  -102 |
    7 | -2926   174     X   -65-42800   321  -163 |
    8 |  5999    46   600    87 -9048 13057  -160 |
    9 |   119   -71  2250   -18  1353  -405   115 |
   10 | -6997    82     X  -102-14092 -4399     6 |
   11 |  4571   -90  -586   -49 -8169   891   170 |
   13 |  2003  -128     X    76  4106  2517    78 |
   15 |  7018   110     -   -78  8547     -   -60 |
   17 | -6212   137     X    31-16469     -  -218 |
   19 | -4478   135     X   183 38778 -3537  -389 |
   20 |  6004   167  2795  -107 19011   330  -104 |
   21 | -2428   203     X   -97-10935     -  -161 |
   22 |  3071   108 -2181    21 12502-10404  -169 |
   23 |   735    84  8302  -101     -     -     - |
   24 | -8165     1  -988  -181-12452 -8936   204 |
   25 |  4590   -36 -2988   175  1990 11360  -151 |
   26 | -4571  -213 -4226   138-19610     -   126 |
   27 |  1741    80 -1504   104-18683  8925  -225 |
   28 |   509  -134 -5980   114 18880 -6210    50 |
   29 |   922  -128 -3956   105 -5065 -1737    47 |
   30 | -7965   -91  8475   208  5784 -5179  -118 |
   31 | -3895     8 -3173   146  -895  -924  -177 |
 -----+-------------------------------------------+
 ALGO |     -  -115     X   -23     -     -   182 |
 ARTU |     -    48     -   -58     -     -     - |
 AUCK |     -   -93     X     -     -     -   128 |
 BRMU |     -   -93     X     -     -     -   127 |
 CAS1 |     -     5 -2547  -100     -     -   108 |
 DRAO |     -   -13     X  -125     -     -   159 |
 EISL |     -     -   331  -237     -     -   269 |
 HOB2 |     -   -70    45     -     -     -    96 |
 KARR |     -   -19     -    23     -     -     - |
 KERG |     -    23     -     -     -     -   -32 |
 KWJ1 |     -     - -7712   -70     -     -    80 |
 MAC1 |     -    32  -741   -38     -     -     - |
 MATE |     -  -156     -     -     -     -   213 |
 MAW1 |     -   -18     -    22     -     -     - |
 MCM4 |     -     -     X   309     -     -  -351 |
 NYA1 |     -    33     -   -40     -     -     - |
 ONSA |     -  -157   634     -     -     -   215 |
 PIE1 |     -  -174 -6250     -     -     -   238 |
 POTS |     -    44  3131   -53     -     -     - |
 SANT |     -     -  5001    10     -     -   -11 |
 STJO |     -   -61     -    73     -     -     - |
 SUTH |     -   253     -  -285     -     -   -21 |
 TIDB |     -    49     X   -59     -     -     - |
 TIXI |     -   -79     -    95     -     -     - |
 TSKB |     -    46 -1447     -     -     -   -63 |
 URUM |     -     -     -   -69     -     -    78 |
 USNO |     -  -102 -4902     -     -     -   139 |
 WHIT |     -   -39     -    47     -     -     - |
 WSRT |     -   -93     -     -     -     -   128 |
 WUHN |     -    70     -  -191     -     -   120 |
 ZWEN |     -     -     -   -80     -     -    91 |
 -----+-------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   usn | NEPO RMS (ns)
 -----+-------------------------------------------+--------------
    1 |  3379    67  2183    31  5656  1650    68 |  288   2.86
    2 |  3413    64  4859    83  3793  3296    54 |  286   2.48
    3 |  8676    65     X    90  1826  1535    61 |  276   1.40
    4 |  3403   122     X    27  4220  2831   163 |  288   0.82
    5 |  3775    56     X    46  4126     -    81 |  288   1.54
    6 |  9567    50  4493    68 10533     -    59 |  288   9.27
    7 |  2392   105     X    72 11808  1016    70 |  277   1.60
    8 |  4548    38  5034    51  6646  6523    75 |  288   4.25
    9 |  2770    61  2110    57  3518  3038    62 |  288   1.96
   10 |  3257   131     X    57  3700  3307   200 |  277   1.59
   11 |  1432    74  2678    99  1549   361   167 |  288   0.56
   13 |  1857    44     X    39  1350  1222    74 |  288   0.15
   15 |  3360    52     -    65  2600     -    53 |  287   1.22
   17 |  4880    48     X    44  2306     -    58 |  288   2.26
   19 |  3301   154     X   168  2447  2516   138 |  287   1.74
   20 |   956   140  2693   102  2509   620   238 |  288   0.33
   21 |  4269   169     X   180  3232     -   192 |  275   2.80
   22 |  1248    82  4982    63  1688  7174    59 |  288   0.67
   23 |  6243   218  1343   263     -     -     - |  221   5.58
   24 |  6666    77  3113    43  1870  1729    64 |  287   1.58
   25 |  3353    36  3982    69  3450  6168    67 |  288   1.27
   26 |  2393    35  3755    46  4498     -    54 |  288   0.75
   27 |  2694    71  5797   168  1812  4847   133 |  288   1.60
   28 |  7365    55  3135   133  1775  5613   110 |  288   1.29
   29 |   724    47  3874    38  3224   849    70 |  288   0.74
   30 |  2174    44  1897   127  1984  2191   120 |  288   1.15
   31 |  4241    97  4656    95  3437  3228    50 |  279   3.37
 -----+-------------------------------------------+--------------
 ALGO |     -    48     X    67     -     -    39 |  288   0.04
 ARTU |     -    27     -    32     -     -     - |  283  23.68
 AUCK |     -    19     X     -     -     -    26 |  286  33.88
 BRMU |     -    39     X     -     -     -    53 |  282  18.44
 CAS1 |     -    51  3669    76     -     -    30 |  288  11.27
 DRAO |     -    32     X    63     -     -    53 |  286    >>>
 EISL |     -     -  4598    37     -     -    42 |  286  33.19
 HOB2 |     -    40  6040     -     -     -    54 |  287   0.06
 KARR |     -    25     -    30     -     -     - |  287 143.27
 KERG |     -    38     -     -     -     -    52 |  287    >>>
 KWJ1 |     -     -  1912   216     -     -   245 |  162  66.05
 MAC1 |     -    47  2301    57     -     -     - |  256  10.12
 MATE |     -   186     -     -     -     -   254 |  251   0.17
 MAW1 |     -    64     -    77     -     -     - |  287  25.06
 MCM4 |     -     -     X   135     -     -   153 |  272   8.32
 NYA1 |     -    40     -    48     -     -     - |  287   0.05
 ONSA |     -    26  4526     -     -     -    35 |  287  16.32
 PIE1 |     -    28  2893     -     -     -    38 |  281   0.05
 POTS |     -    17  4174    20     -     -     - |  287  15.44
 SANT |     -     -  2045   320     -     -   363 |  107  29.39
 STJO |     -    21     -    25     -     -     - |  287   2.32
 SUTH |     -    67     -    35     -     -    68 |  288  21.66
 TIDB |     -    39     X    47     -     -     - |  287   0.15
 TIXI |     -    33     -    40     -     -     - |  286  14.85
 TSKB |     -    45  2146     -     -     -    61 |  229   1.54
 URUM |     -     -     -    39     -     -    45 |  288  72.52
 USNO |     -    28  2048     -     -     -    38 |  287   0.04
 WHIT |     -    48     -    58     -     -     - |  286    >>>
 WSRT |     -    37     -     -     -     -    51 |  287   0.07
 WUHN |     -    32     -    38     -     -    42 |  287  29.15
 ZWEN |     -     -     -    28     -     -    32 |  266  77.96
 -----+-------------------------------------------+--------------
 TOT  |  4328    75  3912    91  4416  3592   106 |


 BEST CLOCK FIT: USNO   287   0.04 (ns) 

