
 GPS week: 1090   Day: 3   MJD: 51877                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2550      0    -0.03     0.15     5.12     0.00
 cod |    96     0   2550      0    -0.03     0.18     5.12     0.00
 esa |   288     1  12872    659  2080.66     8.49     0.14    19.21
 gfz |   288     0  11384     12    -0.32     0.54     0.10    25.94
 igp |    96     0   2475      0     0.02     0.05     4.65     0.00
 igu |    96     0   2091      0    -0.02     0.18     3.78     0.00
 ngs |    96     0   2550      0    -0.03     0.16     4.99     0.00
 usn |   288     0  12960    515  2078.52     7.59     0.04    54.84

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   usn |
 -----+-------------------------------------------------+
    1 |  2957  2964  -288   432  6398 -7350  2064  -111 |
    2 |  1325  1337    92   -87 24475     -  1316     9 |
    3 |   666   682   121   -26 12909 -4866   918   -28 |
    4 |   579   576   -24   -66-19389  6757   712    40 |
    5 | -2315 -2324   272   -46 43790     - -1613   -73 |
    6 | -6748 -6746   231    54 11680 -5221 -6009  -106 |
    7 | -3070 -3085    72   162-23964  2212 -2151  -101 |
    8 |  -133  -144   148   159  6512  -988  -118  -127 |
    9 | -1611 -1591   436  -102  5638     - -1634  -104 |
   10 | -5432 -5465   -44   -70 -9221  3452 -5169    47 |
   11 |  1922  1974    54  -218 -2651 -1329  2463    84 |
   13 |   867   881  -439     4  5259  2859   781   139 |
   15 | -1046 -1043     -    -7 11022 -3966  -380     3 |
   17 | -2863 -2887   313   123 15091  -750 -2298  -168 |
   19 |  8464  8481   270   309 25201 11465  6457  -241 |
   20 |  6838  6824  -344  -201  7670  -471  6426   212 |
   21 | -4643 -4635   194    32-33853 18598 -3678   -78 |
   22 |  7949  7958   402   161-50035  1486  7363  -206 |
   23 |  2082  2048   142  -105     -     -  2056     - |
   24 | -4262 -4257   -66  -132 10611  -321 -4350    86 |
   25 | -3792 -3792  -285   354-25852  3160 -3680   -68 |
   26 | -2743 -2747   281  -172-13678     - -2912   -17 |
   27 | -3743 -3737   197   265-19440-13383 -3894  -194 |
   28 |  8193  8186    40  -181 16615  -334  7703    73 |
   29 |   794   780   -71   165 -9629 -2800   307   -53 |
   30 | -2421 -2436   131   269    42 -5656 -2871  -172 |
   31 |  1924  1927   347    68  2608 -1959  2047  -149 |
 -----+-------------------------------------------------+
 ALGO |     -     -     X  -108     -     -     -    51 |
 ASC1 |     -     -  -216  -351     -     -     -   236 |
 AUCK |     -     -  -240     -     -     -     -    84 |
 BRMU |     -     -   299     -     -     -     -  -105 |
 CAS1 |     -     -   -94   -50     -     -     -    56 |
 DRAO |     -     -     -  -215     -     -     -   102 |
 FAIR |     -     -  -203     -     -     -     -    71 |
 FORT |     -     -    86     -     -     -     -   -30 |
 GALA |     -     -   -55    41     -     -     -     - |
 HOB2 |     -     -  -110   -88     -     -     -    77 |
 KOKB |     -     -    79   -59     -     -     -     X |
 KWJ1 |     -     -  -123  -419     -     -     -   220 |
 MAC1 |     -     -    33   -24     -     -     -     - |
 MCM4 |     -     -   -20    63     -     -     -   -25 |
 ONSA |     -     -    40     -     -     -     -   -14 |
 PIE1 |     -     -  -713     -     -     -     -   250 |
 POTS |     -     -    73   -54     -     -     -     - |
 SANT |     -     -    25   -19     -     -     -     X |
 TSKB |     -     -  -122     -     -     -     -    43 |
 URUM |     -     -     -   -65     -     -     -    31 |
 USNO |     -     -    45     -     -     -     -   -16 |
 WTZR |     -     -   -73     -     -     -     -    26 |
 WUHN |     -     -     -  -124     -     -     -    58 |
 YAR2 |     -     -  -187     -     -     -     -    65 |
 ZWEN |     -     -     X  -102     -     -     -    48 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  4506  4495   113    51  4704  3163  3933    45 |  288   3.79
    2 |  3836  3827   121    86  7586     -  3770    52 |  288   1.80
    3 |  3459  3461   254    73  3780  2556  3255    58 |  276   2.90
    4 |  2007  1978    91    40  4364  2954  1884    35 |  288   0.90
    5 |  7395  7397   136    62  3878     -  7544    33 |  288   3.87
    6 | 11227 11204   192    62  9396  3675 10893    73 |  288   8.01
    7 |  5244  5242   227   116  8657  1813  4557    34 |  277   1.33
    8 |  3843  3825   154    70  5902  2835  3946    46 |  288   3.74
    9 |  1672  1671   119   123  1832     -  1817    77 |  288   1.44
   10 |  2291  2346   168   175  2193  2149  2179    53 |  276   2.11
   11 |  1426  1458   117    75  1105  1213  1379    63 |  288   0.65
   13 |  1418  1434    86    68  1240  1715  1454    29 |  288   0.40
   15 |  5622  5610     -   178  4979  2981  6185    84 |  286   4.41
   17 |  9099  9110    70   105  5561  5172  9468    53 |  288   4.91
   19 |  9214  9211    56    45  6696  4844  7963    25 |  288   2.74
   20 |  2194  2221   203   148   578  1324  1860    30 |  287   0.27
   21 |  7213  7224   113    90  2737  9784  6642    42 |  277   2.30
   22 |  5163  5145   346   158  3440  1152  4901    45 |  288   0.95
   23 |  6013  5991   145   108     -     -  6121     - |  222   5.26
   24 |  3718  3720    92    30  2566  3683  3732    38 |  288   2.44
   25 |  2496  2535   127   106  2103  1239  2561    24 |  288   1.92
   26 |  2462  2447    98    89  4762     -  2473    30 |  288   0.77
   27 |  7285  7260   191   140  7203  7859  7410    26 |  288   2.89
   28 |  1286  1294    78    62  2216   650  1336    29 |  288   0.40
   29 |  2398  2401    94    46  2784  1940  2199    22 |  288   0.81
   30 |  4069  4072   123    68  1446  3542  4124    63 |  288   1.30
   31 |  3032  3043   125   108  3448  2926  2813    36 |  280   2.55
 -----+-------------------------------------------------+--------------
 ALGO |     -     -     X    52     -     -     -    25 |  288   0.08
 ASC1 |     -     -   101    29     -     -     -    26 |  288 516.65
 AUCK |     -     -    98     -     -     -     -    34 |  265  48.03
 BRMU |     -     -   105     -     -     -     -    37 |  286  32.34
 CAS1 |     -     -    74    28     -     -     -    34 |  288  11.40
 DRAO |     -     -     -    34     -     -     -    16 |  288   0.13
 FAIR |     -     -   159     -     -     -     -    56 |  214   0.27
 FORT |     -     -   143     -     -     -     -    50 |  133   0.08
 GALA |     -     -    61    45     -     -     -     - |  287  26.98
 HOB2 |     -     -    80    46     -     -     -    22 |  288   0.09
 KOKB |     -     -   217   161     -     -     -     X |  247   2.12
 KWJ1 |     -     -   143    77     -     -     -    56 |  192  75.37
 MAC1 |     -     -   231   171     -     -     -     - |  218  18.39
 MCM4 |     -     -    82   179     -     -     -    98 |  252    >>>
 ONSA |     -     -    77     -     -     -     -    27 |  287  18.85
 PIE1 |     -     -    83     -     -     -     -    29 |  265   0.04
 POTS |     -     -   172   128     -     -     -     - |  251  14.24
 SANT |     -     -    84    62     -     -     -     X |  244  20.18
 TSKB |     -     -    72     -     -     -     -    25 |  263   1.24
 URUM |     -     -     -    27     -     -     -    13 |  288  43.78
 USNO |     -     -    79     -     -     -     -    28 |  287   0.10
 WTZR |     -     -    89     -     -     -     -    31 |  284   0.22
 WUHN |     -     -     -    26     -     -     -    12 |  111  24.99
 YAR2 |     -     -   157     -     -     -     -    55 |  253 671.71
 ZWEN |     -     -     X    92     -     -     -    43 |  225    >>>
 -----+-------------------------------------------------+--------------
 TOT  |  5124  5121   140    97  4655  3778  4992    44 |


 BEST CLOCK FIT: PIE1   265   0.04 (ns) 

