
 GPS week: 1090   Day: 1   MJD: 51875                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2573      0     0.06    -0.02     5.35     0.00
 cod |   288     0  15794      1    -0.14    -1.15     0.11    29.29
 esa |   288     0  16479    405   137.03   -12.28     0.20    16.24
 gfz |   288     0  12832    544 -1066.38    -2.74     0.14    24.79
 igp |    96     0   2390      0     0.29    -0.35     5.30     0.00
 igu |    96     0   1910     15     0.72    -2.81     6.74     0.00
 jpl |    96     0   2569     15    -5.77     2.40     0.15     0.00
 ngs |    96     0   2573      0     0.06    -0.03     5.20     0.00
 usn |   288     0  14595     83   817.40    20.27     0.11    29.68

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------+
    1 |  2635   313  -111   117-11960  6518   127  2594  -290 |
    2 |  1612  -111   395    20 28123 -1351   -69  1100  -143 |
    3 |  -894   -69   385    61-17590  4589    78   244  -200 |
    4 | -1964  -207  -134   105  1125  1704  -586 -2546   158 |
    5 |  6626   213  -259    -9  7232     -   164  6275   -23 |
    6 |  3351    71    69    17-10558  7973  -141  3078  -108 |
    7 | -4785    89   -76   132-38915  -254    47 -4181  -143 |
    8 | -3886   201   456  -305-41419     -    70 -2336  -148 |
    9 |  1828   -58    66   -58 30326     -    11  1421    59 |
   10 | -6349   -55   478   -57 -6227  3229  -138 -6129  -112 |
   11 |   610   -16   258  -112  8236  -895   183   562   -35 |
   13 |  1738   102  -304  -126  9024     -  -190  1587   193 |
   15 |  1395   128     -    76     -     -   -35  1691  -167 |
   17 |  2767   246  -296   134 14502-16036   112  2693  -167 |
   19 |  3390   294   -61    -2 -5885  2432   246  2504  -197 |
   20 |  3871    76  -239    49 15308  2928   439  4141    33 |
   21 |  2419   227   411  -186  7702-43554  -102  1745  -241 |
   22 |-14601   292   144  -137 38388 38455   276-13688  -205 |
   23 |  1829   -97   781  -254     -     -  -197  1653     - |
   24 | -2101  -127  -186    65 -5366  8711  -511 -1769   148 |
   25 | -6018   188   -90    91  7123 -6964    69 -6283  -172 |
   26 | -3220  -427   685   -71-10975  1684  -307 -3382    36 |
   27 |  3605   163   487   -83  4500  3254    34  3414  -321 |
   28 | 12230   103   208   -52-15954  2495   260 12020  -151 |
   29 | -2337   -18   283  -193-13929     -   158 -2644    22 |
   30 |   982   -43  -162   262 26459 -5283  -104     1   -95 |
   31 | -4818   106   188   185-19231 -4992   132 -3899  -343 |
 -----+-------------------------------------------------------+
 AREQ |     -     -  -165     -     -     -     -     -    90 |
 ARTU |     -    69     -   -82     -     -     -     -     - |
 ASC1 |     -     -   -89  -107     -     -     -     -   137 |
 AUCK |     -  -807  -651  1741     -     -     -     -  -365 |
 BAHR |     -    41   -67     X     -     -     -     -    -3 |
 BARB |     -    51   -92     -     -     -     -     -     - |
 BOR1 |     -    79  -143     -     -     -     -     -     - |
 BRMU |     -  -107   141     -     -     -     -     -    14 |
 DAEJ |     - -1185     -     -     -     -     -     -  1169 |
 DRAO |     -    64    61  -148     -     -     -     -    27 |
 FAIR |     -     -   -94  -261     -     -     -     -   218 |
 FORT |     -     -  -723     -     -     -     -     -   396 |
 GALA |     -    14   -25     -     -     -     -     -     - |
 GRAZ |     -    -5     8     -     -     -     -     -     - |
 GUAM |     -     -    31     -     -     -     -     -   -17 |
 KIRU |     -  -212   382     -     -     -     -     -     - |
 KIT3 |     -     -    28   -18     -     -     -     -     - |
 KOKB |     -     -   142    -9     -     -     -     -   -83 |
 KOUR |     -  -142   257     -     -     -     -     -     - |
 KWJ1 |     -     -   -50   -86     -     -     -     -    97 |
 LHAS |     -    19   -35     -     -     -     -     -     - |
 LPGS |     -   468  -844     X     -     -     -     -     - |
 MALI |     -     -  -429     -     -     -     -     -   235 |
 MATE |     -  -119     -     -     -     -     -     -   118 |
 MCM4 |     -    44    70  -173     -     -     -     -    69 |
 MDO1 |     -   228  -410     -     -     -     -     -     - |
 NLIB |     -    47     -  -401     -     -     -     -   290 |
 NRC2 |     -   815 -1469     -     -     -     -     -     - |
 NYA1 |     -    43     -   -51     -     -     -     -     - |
 ONSA |     -  -185   878  -298     -     -     -     -   -48 |
 PIE1 |     -  -124     X     -     -     -     -     -   122 |
 POTS |     -   -21    38     -     -     -     -     -     - |
 REYK |     -   -59   107     -     -     -     -     -     - |
 SANT |     -     -   171     8     -     -     -     -  -117 |
 STJO |     -   -28     -    33     -     -     -     -     - |
 THU1 |     -   -30     -     -     -     -     -     -    30 |
 TIXI |     -    62     -   -73     -     -     -     -     - |
 TRO1 |     -   -93     -   110     -     -     -     -     - |
 TSKB |     -     -   -33     -     -     -     -     -    18 |
 URUM |     -   -23     -     -     -     -     -     -    23 |
 USNO |     -    19  -154     -     -     -     -     -    65 |
 USUD |     -     8   -15     -     -     -     -     -     - |
 VILL |     -    66  -119     -     -     -     -     -     - |
 WSRT |     -   -34     -     -     -     -     -     -    34 |
 WTZR |     -   -98   -24     -     -     -     -     -   109 |
 WUHN |     -   -98     -   -63     -     -     -     -   150 |
 ZWEN |     -     -  -711     -     -     -     -     -   389 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  5440    82   102   113  4167  2735    94  5332    83 |  288   3.82
    2 |  2897   208   115   119  5915  2329    96  3055    68 |  288   2.75
    3 |  6459   117    62   120  2661  4284   171  5364    65 |  288   2.44
    4 |  4243   158   280   125  3334  1275   271  3809   147 |  286   0.91
    5 |  5877   301   221   126  9089     -   122  5942   126 |  288   2.20
    6 |  7416    95   134   156  7950  3364    88  7519   148 |  288   7.74
    7 |  3683   162   115   241 10114  1221   114  3352    57 |  288   1.22
    8 | 10649    77   222    97 10518     -   158  9909    78 |  288   5.05
    9 |  1644   135   195   106  4405     -   101  1408    69 |  288   1.56
   10 |  2193   324   452   182  1966  2295   186  2492   154 |  273   1.90
   11 |  2073    93    76    96   951  2375   108  1923    71 |  288   0.41
   13 |  1186   117    54   103  2005     -   113  1065    49 |  288   0.22
   15 |  6472   107     -    45     -     -    72  6701    88 |  288   4.92
   17 |  9009   145   363   338 10333  8004   206  8982   121 |  288   7.09
   19 |  7125    84   178   123  2986  4525   132  7095    65 |  288   2.46
   20 |  1462   143   434   180  1506  1427   174  1501    73 |  288   0.37
   21 |  6530   131    95   121  2316 16824   107  5873    60 |  276   1.90
   22 |  6542   169   245   229  6273 21372    75  7246    88 |  287   1.90
   23 |  5249   132   230   146     -     -   204  5201     - |  262   5.43
   24 |  4432   135   476   211  3785  4677   233  4565   166 |  288   1.47
   25 |  7381    72    72    83  3820  6084   149  7239    42 |  288   1.23
   26 |  1119    90   168    82  2564  1587    97   994    47 |  288   0.45
   27 |  4268    58   257   226  3013  3108   141  4065    85 |  288   2.94
   28 |  2020   111    80    93  2705  2879    70  1983    76 |  288   1.99
   29 |  1417    75   158   100  3467     -   166  1282    57 |  288   0.74
   30 |  6875   169   100    69  4108  4241   171  6586   140 |  288   1.58
   31 |  4024    76   103    62  2718  3096   172  3276    44 |  288   2.77
 -----+-------------------------------------------------------+--------------
 AREQ |     -     -   110     -     -     -     -     -    60 |  287  34.57
 ARTU |     -    51     -    60     -     -     -     -     - |  286  18.45
 ASC1 |     -     -    76    53     -     -     -     -    70 |  288 449.61
 AUCK |     -   138    70    94     -     -     -     -    82 |  288  45.89
 BAHR |     -   146   104     X     -     -     -     -   137 |  287   0.50
 BARB |     -    93   167     -     -     -     -     -     - |  286  27.44
 BOR1 |     -    27    49     -     -     -     -     -     - |  278   3.58
 BRMU |     -    92    88     -     -     -     -     -    45 |  288  37.13
 DAEJ |     -    65     -     -     -     -     -     -    64 |  287   1.95
 DRAO |     -    66    94    43     -     -     -     -    33 |  287   0.17
 FAIR |     -     -   249   220     -     -     -     -   208 |  275   0.18
 FORT |     -     -   433     -     -     -     -     -   237 |  139   0.81
 GALA |     -    41    74     -     -     -     -     -     - |  162  18.10
 GRAZ |     -   237   427     -     -     -     -     -     - |  210  39.98
 GUAM |     -     -    73     -     -     -     -     -    40 |  288  38.18
 KIRU |     -   119   214     -     -     -     -     -     - |  270   1.69
 KIT3 |     -     -    44    29     -     -     -     -     - |  287  21.12
 KOKB |     -     -   256   133     -     -     -     -   234 |  287   0.49
 KOUR |     -    38    69     -     -     -     -     -     - |  281   7.62
 KWJ1 |     -     -   227   211     -     -     -     -   210 |  248  96.88
 LHAS |     -    40    72     -     -     -     -     -     - |  278  16.69
 LPGS |     -   198   357     X     -     -     -     -     - |  249  75.05
 MALI |     -     -   403     -     -     -     -     -   221 |  209  11.96
 MATE |     -    27     -     -     -     -     -     -    26 |  287   0.08
 MCM4 |     -   232   383   170     -     -     -     -   276 |  272  10.90
 MDO1 |     -    62   111     -     -     -     -     -     - |  250  29.66
 NLIB |     -    61     -    46     -     -     -     -    47 |  288   0.06
 NRC2 |     -    21    38     -     -     -     -     -     - |  286   0.11
 NYA1 |     -    42     -    50     -     -     -     -     - |  287   0.11
 ONSA |     -    32    58    32     -     -     -     -    23 |  288  17.81
 PIE1 |     -    60     X     -     -     -     -     -    59 |  248   0.10
 POTS |     -    16    29     -     -     -     -     -     - |  276  14.68
 REYK |     -    29    52     -     -     -     -     -     - |  285   8.45
 SANT |     -     -   313   139     -     -     -     -   247 |  256  12.02
 STJO |     -    47     -    55     -     -     -     -     - |  287   2.21
 THU1 |     -    61     -     -     -     -     -     -    61 |  269  13.02
 TIXI |     -    59     -    70     -     -     -     -     - |  278  15.50
 TRO1 |     -    58     -    69     -     -     -     -     - |  283  10.74
 TSKB |     -     -    80     -     -     -     -     -    44 |  220   1.03
 URUM |     -    48     -     -     -     -     -     -    47 |  286  36.87
 USNO |     -    63    56     -     -     -     -     -    38 |  288   0.05
 USUD |     -    56   101     -     -     -     -     -     - |  287   0.47
 VILL |     -    18    33     -     -     -     -     -     - |  287   4.12
 WSRT |     -    28     -     -     -     -     -     -    27 |  288   0.06
 WTZR |     -    54   112     -     -     -     -     -    50 |  288   0.07
 WUHN |     -    98     -    89     -     -     -     -    34 |  286  35.09
 ZWEN |     -     -   171     -     -     -     -     -    93 |  120    >>>
 -----+-------------------------------------------------------+--------------
 TOT  |  5348   114   202   135  5304  6738   149  5204   109 |


 BEST CLOCK FIT: USNO   288   0.05 (ns) 

