
 GPS week: 1090   Day: 0   MJD: 51874                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2580      0    -0.14     0.23     5.25     0.00
 cod |   287     0  16470      0     1.30    -4.38     0.12    25.60
 esa |   288     0  16329    656  2035.28    12.67     0.14    19.85
 gfz |   288     0  13676    301    -0.82     1.21     0.09    35.47
 igp |    96     0   2393      0    -0.12     0.26     5.21     0.00
 igu |    96     0   2204      0    -0.15     0.24     4.16     0.00
 ngs |    96     0   2580      0    -0.14     0.23     5.03     0.00
 usn |   288     0  14179    579  2053.21    12.59     0.15    19.09

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   usn |
 -----+-------------------------------------------------+
    1 | -6086   205  -483   257-10537 -5268 -4951  -249 |
    2 |  2655   -59   386   -29 32997  5882  1665  -278 |
    3 | -6740   -87   620  -194 -2736 -2228 -6225  -178 |
    4 |  4400    36   163   -68  5197 -8007  3996   -90 |
    5 | -2721   161  -311    46 28509 -9245 -2269    24 |
    6 | -3809   -24   454  -180-24473  6365 -3892  -106 |
    7 | -5112   131   221   -58-17929 -7034 -4893  -291 |
    8 | -3702    50   260   -30-32193  1516 -4033  -281 |
    9 |  5738   122  -183   -19 59593 -6995  5411    59 |
   10 | -4908    95     X   -27-19154  2301 -5286   -72 |
   11 |  3955    78   -92    13 14744 -5794  4025   -29 |
   13 |  2844    21  -644   271 -5692 -3099  2918   138 |
   15 |   248   112     -   -55     -     -   528   -49 |
   17 |  2948   103  -131    95-11734 22236  2747  -178 |
   19 | -1134    26  -295   289 20470 -9242 -1603  -264 |
   20 |  5509  -198   773   -48  2641 -2609  5063  -463 |
   21 | -2158   231    55   -88 -9882     - -1709  -187 |
   22 |  9602   129    -8    -5 36830 18326  7631  -148 |
   23 | -2337   316  -407   -14     -     - -1583     - |
   24 | -3886   144  -354    69-35352   615 -3349    55 |
   25 |  -996   -22   362   -63 15129  1772  -727  -227 |
   26 | -1687   -69  -107     6 -7610 -2794 -1556   191 |
   27 |  1722  -147   794   -52-21319 -9778  1982  -539 |
   28 |  1368  -113   751  -277 -1286  4739  2387  -130 |
   29 |  1416   -22    81   -54-13736     -  1494    43 |
   30 |  5802    15   -97    87 -7385  6094  5154   -81 |
   31 | -3315    17   477   -83  3765  2372 -3269  -364 |
 -----+-------------------------------------------------+
 ALBH |     -  -196   253     -     -     -     -     - |
 ALGO |     -    27     X  -143     -     -     -   229 |
 AREQ |     -  -125    86   -45     -     -     -   162 |
 ARTU |     -    90     -   -65     -     -     -     - |
 ASC1 |     -   529  -416  -321     -     -     -   321 |
 AUCK |     -  -403  -392   580     -     -     -  -161 |
 BAHR |     -   -32   -28     X     -     -     -    71 |
 BOR1 |     -   -34    43     -     -     -     -     - |
 DAEJ |     -  -907     -     -     -     -     -  1216 |
 DRAO |     -    53   326  -221     -     -     -     2 |
 FAIR |     -     -    45  -115     -     -     -   148 |
 GALA |     -   111   -35   -58     -     -     -     - |
 GRAZ |     -   721  -930     -     -     -     -     - |
 GUAM |     -   -15   -52     -     -     -     -    74 |
 HOB2 |     -  -125   152   -14     -     -     -    35 |
 KIRU |     -    16   -21     -     -     -     -     - |
 KOKB |     -     -   136   -76     -     -     -     X |
 KOUR |     -  -181   425  -137     -     -     -    31 |
 KWJ1 |     -     -   -26   -19     -     -     -    59 |
 LHAS |     -    -8    10     -     -     -     -     - |
 LPGS |     -   821 -1059     -     -     -     -     - |
 MALI |     -     -  -275     -     -     -     -   286 |
 MAW1 |     -   124     -   -89     -     -     -     - |
 MCM4 |     -  -127  -143    41     -     -     -   293 |
 MDO1 |     -  -123   158     -     -     -     -     - |
 NLIB |     -   116  -218     -     -     -     -    79 |
 NRC2 |     -   928 -1197     -     -     -     -     - |
 ONSA |     - -1331  -104  1015     -     -     -     - |
 PIE1 |     - -1080   441     -     -     -     -   666 |
 POTS |     -    -4    30  -106     -     -     -   172 |
 SANT |     -     -    16   -26     -     -     -    34 |
 STJO |     -    71    17   -61     -     -     -     - |
 TSKB |     -   197  -321     -     -     -     -   121 |
 URUM |     -    86     -   -96     -     -     -    65 |
 USUD |     -     3    -4     -     -     -     -     - |
 VILL |     -   -90   116     -     -     -     -     - |
 WSRT |     -   -58     -     -     -     -     -    77 |
 WTZR |     -  -145    50     -     -     -     -   141 |
 WUHN |     -   153     -  -149     -     -     -    72 |
 ZWEN |     -     -  -526   294     -     -     -     X |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  4976    69    70    40  3652  2995  4768    80 |  288   3.29
    2 |  6526   184   119    83  6900  4568  6203    58 |  288   3.81
    3 |  2451   102   112    64  3137  2857  2874   142 |  288   2.54
    4 |  2609    56   119    70  1861  4075  2230    77 |  288   0.96
    5 |  2905   362   188   121  4177  5352  2761   122 |  288   2.50
    6 |  9085   201   157    55  9307  4102  9013    46 |  288   9.66
    7 |  1149    77   106    92  9649  2509  1354   116 |  288   1.03
    8 |  7194    95   166    44 11021  5983  6894    37 |  288   3.65
    9 |  3274   158   221   129  8747  4532  3408   146 |  288   1.81
   10 |  4856   253     X    54  3785  2316  4617   265 |  277   2.27
   11 |   849    90   166   138  2040  2740   884    86 |  288   0.45
   13 |  1467    73    67    50   684   978  1492    72 |  288   0.21
   15 |  5888   108     -   109     -     -  5802   123 |  285   3.33
   17 |  3871    58    95   139  3827  8296  3742   151 |  288   3.37
   19 |  6219    54    80    96  3837  6328  6515   210 |  288   3.12
   20 |  2496    93    71   123   935  1219  2585   131 |  288   0.35
   21 | 10082   219   550   120  6596     - 10000   130 |  277   4.41
   22 | 12933   137   123    75  5947  4798 11376    94 |  288   4.82
   23 |  6756   282   201   231     -     -  6232     - |  276   6.61
   24 |  2354   117    80    52  3625  1565  2997    98 |  288   2.79
   25 |  2597    94   208    51  3105  2510  2716    90 |  288   2.57
   26 |  1537   111   315    91  2757  1250  1473   347 |  288   0.64
   27 |  2486   125    50    51  2689  4238  2410   208 |  288   2.19
   28 |  6470    46    38    66  1279  5191  5605    88 |  288   0.53
   29 |  1184    37    54    36  3650     -  1210   131 |  288   0.92
   30 |  3075    97    83   104  5201  5323  3206   104 |  288   1.22
   31 |  3417    81    67    47  2711  2782  3398    69 |  288   2.74
 -----+-------------------------------------------------+--------------
 ALBH |     -    50    64     -     -     -     -     - |  287   0.06
 ALGO |     -    33     X    32     -     -     -    46 |  288   0.03
 AREQ |     -    47    38    43     -     -     -    40 |  288  30.32
 ARTU |     -    79     -    57     -     -     -     - |  282  18.07
 ASC1 |     -   130    98    52     -     -     -    82 |  232 376.56
 AUCK |     -   126    45    43     -     -     -    92 |  288  34.61
 BAHR |     -   106    44     X     -     -     -   127 |  287   0.47
 BOR1 |     -    53    68     -     -     -     -     - |  287   3.28
 DAEJ |     -    23     -     -     -     -     -    31 |  287   1.71
 DRAO |     -    34    59    24     -     -     -    55 |  288   0.05
 FAIR |     -     -    65    41     -     -     -    92 |  282   0.20
 GALA |     -    78    44    56     -     -     -     - |  287  33.41
 GRAZ |     -   301   388     -     -     -     -     - |  152  16.96
 GUAM |     -    35    63     -     -     -     -    38 |  288  29.42
 HOB2 |     -   115    44    53     -     -     -    73 |  288   0.07
 KIRU |     -    95   122     -     -     -     -     - |  251 386.95
 KOKB |     -     -   167    93     -     -     -     X |  273   0.41
 KOUR |     -    42   117    29     -     -     -   123 |  283   5.33
 KWJ1 |     -     -   270   167     -     -     -   340 |  246 121.94
 LHAS |     -    34    44     -     -     -     -     - |  282  17.68
 LPGS |     -    88   113     -     -     -     -     - |  164  15.76
 MALI |     -     -   254     -     -     -     -   264 |  215    >>>
 MAW1 |     -    68     -    49     -     -     -     - |  285  27.23
 MCM4 |     -   175   145   134     -     -     -   493 |  288  21.87
 MDO1 |     -    41    53     -     -     -     -     - |  255  20.57
 NLIB |     -    23    54     -     -     -     -    44 |  288   0.04
 NRC2 |     -    39    50     -     -     -     -     - |  274   0.05
 ONSA |     -   101    45    61     -     -     -     - |  288  16.05
 PIE1 |     -    94   136     -     -     -     -   167 |  170  16.77
 POTS |     -    68    45    51     -     -     -    37 |  288  12.80
 SANT |     -     -   256    93     -     -     -   349 |  239  15.66
 STJO |     -    33    35    21     -     -     -     - |  288   2.93
 TSKB |     -    57    65     -     -     -     -    41 |  278   1.17
 URUM |     -    95     -    80     -     -     -    36 |  288  15.56
 USUD |     -    42    54     -     -     -     -     - |  287   0.43
 VILL |     -    83   107     -     -     -     -     - |  287   5.62
 WSRT |     -    51     -     -     -     -     -    68 |  287   0.06
 WTZR |     -    57    65     -     -     -     -    25 |  288   0.08
 WUHN |     -    38     -    62     -     -     -    71 |  287  16.37
 ZWEN |     -     -   174    98     -     -     -     X |  190    >>>
 -----+-------------------------------------------------+--------------
 TOT  |  5252   116   141    86  5205  4157  5028   148 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

