
 GPS week: 1089   Day: 4   MJD: 51871                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2583      0     0.20    -0.42     5.44     0.00
 cod |   288     0  16161    315     3.57    -1.21     0.10    26.17
 esa |   288     0  16289    835  1999.37    10.89     0.09    26.59
 gfz |   288     0  13396     16     0.36    -1.02     0.11    22.03
 igp |    96     0   2301      0     0.23    -0.40     5.32     0.00
 igu |    96     0   2395     94     3.22     4.59     5.15     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14249    504  2016.70    10.95     0.10    25.21

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   sio   usn |
 -----+-------------------------------------------------+
    1 |-11696   333  -181   321-11243-17999     -  -395 |
    2 | -1613   122  -244    46 11518  2526     -    55 |
    3 | -2505  -241   649    -1 22413   963     -  -459 |
    4 |  -706    13   -55   -59 -7006-12713     -    97 |
    5 | -4380   158  -273    51 18899  -778     -    89 |
    6 | -2740    60   112  -136-34579 -2225     -   -53 |
    7 | -1411   150   -35    67-30089 15026     -  -157 |
    8 |   893   199    59  -155 -9234  2210     -  -121 |
    9 | -2384  -113   -88   -84-13596 11693     -   267 |
   10 | -3209   109     X  -107   913  4548     -    -6 |
   11 |  8502    30   194   -86 27398   674     -  -157 |
   13 |  5549   101  -187   -14 17422  2373     -   115 |
   15 |   217   161     -    21 -9200-13148     -  -180 |
   17 |     8   192  -137   -72-21127 -1609     -    39 |
   19 | -4685    95   157   229  8001-18550     -  -444 |
   20 |  5093   263  -162    -4 12057  -418     -   -73 |
   21 |   218  -110   313  -234     -     -     -     - |
   22 |  9077    48   211   -26  7679  3381     -  -243 |
   23 |  1660    88     0   -88     -     X     -     - |
   24 |  6082    54   -86  -135 22096  2410     -   161 |
   25 |  2871    31   191    58 14396 -1367     -  -279 |
   26 | -2913  -281    22    11-17956 -3429     -   207 |
   27 |  1641    -8   111   182-17154  4814     -  -269 |
   28 |  7079   -73   102    25  1290 18300     -   -63 |
   29 |  -525   -21   -33    62     -     -     -     0 |
   30 | -3489   -62  -159   205 10950  5453     -    49 |
   31 | -6718   -46   396   124 -3810 -1980     -  -484 |
 -----+-------------------------------------------------+
 ALGO |     -   -56     X  -172     -     -     -   208 |
 AREQ |     -   -65    64     -     -     -     -     - |
 ARTU |     -   101     -  -120     -     -     -     - |
 ASC1 |     -     -   -16  -185     -     -     -   178 |
 AUCK |     -   -34  -203     -     -     -     -   249 |
 BOR1 |     -    78   -77     -     -     -     -     - |
 BRMU |     -  -172   220     -     -     -     -   -54 |
 CAS1 |     -    21   -79   -49     -     -     -   105 |
 DRAO |     -   -56   115  -190     -     -     -   102 |
 FAIR |     -     -  -108     -     -     -     -   114 |
 FORT |     -     -  -105     -     -     -     -   111 |
 GALA |     -    40   -86    58     -     -     -     - |
 GODE |     -  -164     -     -     -     -     -   170 |
 GRAZ |     -     -   171     -     -     -     -  -181 |
 HOB2 |     -   -31  -222     -     -     -     -   266 |
 KIRU |     -  -371   365     -     -     -     -     - |
 KIT3 |     -   106   -97    -7     -     -     -     - |
 KOKB |     -     -   150  -181     -     -     -     X |
 KOUR |     -  -198   194     -     -     -     -     - |
 KWJ1 |     -     -  -164   139     -     -     -    78 |
 MAC1 |     -  -147   112     8     -     -     -     - |
 MALI |     -     -  -272     -     -     -     -   287 |
 MATE |     -   -50     -     -     -     -     -    52 |
 MAW1 |     -    58     -   -68     -     -     -     - |
 MCM4 |     -     -  -363   392     -     -     -    42 |
 NLIB |     -  -103     -     -     -     -     -   107 |
 NRC2 |     -   -63    62     -     -     -     -     - |
 NYA1 |     -    52     -   -62     -     -     -     - |
 NYAL |     -     -    30     -     -     -     -   -31 |
 ONSA |     -   -64    16     -     -     -     -    49 |
 PIE1 |     -     X  -255     -     -     -     -   268 |
 POTS |     -   -35    34     -     -     -     -     - |
 REYK |     -    71   -70     -     -     -     -     - |
 SANT |     -     -    -7     9     -     -     -     X |
 SEY1 |     -     -   -17    20     -     -     -     - |
 STJO |     -   -37     -    44     -     -     -     - |
 TIXI |     -    22     -   -26     -     -     -     - |
 TRO1 |     -   -56     -    67     -     -     -     - |
 TSKB |     -     -   -75     -     -     -     -    79 |
 URUM |     -   -31     -     -     -     -     -    32 |
 USUD |     -    32   -31     -     -     -     -     - |
 VILL |     -    52   -51     -     -     -     -     - |
 WHIT |     -    54     -   -65     -     -     -     - |
 WSRT |     -   -15     -     -     -     -     -    16 |
 WUHN |     -  -154     -    56     -     -     -   111 |
 YAR2 |     -     -  -227     -     -     -     -   239 |
 ZWEN |     -     -     X   173     -     -     -  -151 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  3660    65    66   260  4909  8385     -   164 |  288   1.95
    2 |  2251   101    73   132  4267  2464     -    65 |  287   1.77
    3 |  2203    69    58    48  4760  2670     -    80 |  288   2.12
    4 |  3148    76    28    93  4824  6375     -    55 |  288   1.24
    5 |  6319   122    51    38  2438  5345     -   106 |  288   2.71
    6 |  9232   178    95    48  8826  3162     -    88 |  288   8.05
    7 |  3864   105    32    64  9697  8260     -   108 |  288   1.78
    8 |  3770    84    71    91  7620  1985     -   129 |  288   3.49
    9 |  1368   110    33   111  2527  4110     -    39 |  288   1.31
   10 |  8117   198     X   125  3572  2874     -   110 |  277   3.34
   11 |  2768   182   108   207  4402   944     -    90 |  288   0.47
   13 |   846    47    45    53  3539   949     -    48 |  288   0.30
   15 |  3642    94     -    79  3564  5340     -   124 |  288   2.92
   17 | 12093    64    55   105  6295  6584     -    55 |  288   5.32
   19 |  8237    85    77    92  5472  8693     -   104 |  288   4.81
   20 |   879   112    94   129  1054  2355     -    58 |  288   0.27
   21 |  9152   238   255   161     -     -     -     - |  276   3.46
   22 |  4518   120    58    44  4354  2061     -    77 |  287   0.75
   23 |  5662   181   181   279     -     X     -     - |  278   5.64
   24 |  2824    99    41    37  8548  2611     -    50 |  288   1.56
   25 |  4232   100    34    68  2393  5284     -    56 |  288   2.47
   26 |  1286   204   191    71  5455  2417     -    41 |  288   0.54
   27 |  7504    62    95    67  6540  6429     -   108 |  288   4.13
   28 |  6865    79   162    77  1168 11016     -   125 |  288   0.66
   29 |  1628    63    44    42     -     -     -    56 |  288   0.65
   30 |  4866   106    55    54  6153  4025     -   132 |  288   1.08
   31 |  4979    70    49    26  4087  1942     -    26 |  288   2.75
 -----+-------------------------------------------------+--------------
 ALGO |     -    58     X    38     -     -     -    39 |  287   0.03
 AREQ |     -    38    37     -     -     -     -     - |  277  39.50
 ARTU |     -    14     -    17     -     -     -     - |  286  20.79
 ASC1 |     -     -    81   136     -     -     -    59 |  286 119.29
 AUCK |     -    53    26     -     -     -     -    47 |  288  25.34
 BOR1 |     -    22    21     -     -     -     -     - |  288   2.57
 BRMU |     -    37    35     -     -     -     -    31 |  288  15.58
 CAS1 |     -   159    56    50     -     -     -   102 |  288  12.06
 DRAO |     -    35    51    42     -     -     -    37 |  288   0.06
 FAIR |     -     -   222     -     -     -     -   234 |  282   0.23
 FORT |     -     -    52     -     -     -     -    55 |  192   0.25
 GALA |     -    32    27    22     -     -     -     - |  288  34.10
 GODE |     -    49     -     -     -     -     -    51 |  285   0.08
 GRAZ |     -     -    13     -     -     -     -    14 |   97   3.33
 HOB2 |     -    50    35     -     -     -     -    30 |  288   0.10
 KIRU |     -    47    46     -     -     -     -     - |  288   2.12
 KIT3 |     -    30    17    29     -     -     -     - |  288  20.79
 KOKB |     -     -   114   138     -     -     -     X |  247   1.67
 KOUR |     -    70    69     -     -     -     -     - |  255   6.56
 KWJ1 |     -     -   168   114     -     -     -   221 |  260  78.34
 MAC1 |     -   201   149   178     -     -     -     - |  256  12.70
 MALI |     -     -    16     -     -     -     -    17 |  103    >>>
 MATE |     -    38     -     -     -     -     -    39 |  287   0.10
 MAW1 |     -    34     -    40     -     -     -     - |  287  25.65
 MCM4 |     -     -   147   285     -     -     -   197 |  286    >>>
 NLIB |     -   258     -     -     -     -     -   268 |  285   0.15
 NRC2 |     -    56    55     -     -     -     -     - |  287   0.08
 NYA1 |     -    20     -    24     -     -     -     - |  288   0.05
 NYAL |     -     -    34     -     -     -     -    36 |  283   0.06
 ONSA |     -    30    25     -     -     -     -    37 |  288  17.79
 PIE1 |     -     X   136     -     -     -     -   144 |  288   0.16
 POTS |     -    27    27     -     -     -     -     - |  287  13.62
 REYK |     -    16    16     -     -     -     -     - |  288   7.78
 SANT |     -     -   130   157     -     -     -     X |  237 124.27
 SEY1 |     -     -   236   284     -     -     -     - |  199  31.88
 STJO |     -    46     -    55     -     -     -     - |  288   3.40
 TIXI |     -    18     -    21     -     -     -     - |  287  13.91
 TRO1 |     -    27     -    32     -     -     -     - |  287  10.29
 TSKB |     -     -    46     -     -     -     -    49 |  287   0.92
 URUM |     -    58     -     -     -     -     -    60 |  286  80.17
 USUD |     -    46    45     -     -     -     -     - |  288   0.48
 VILL |     -    21    20     -     -     -     -     - |  287  12.78
 WHIT |     -    29     -    34     -     -     -     - |  288   5.25
 WSRT |     -    66     -     -     -     -     -    69 |  288   0.07
 WUHN |     -    27     -    62     -     -     -    50 |  287  18.05
 YAR2 |     -     -   100     -     -     -     -   106 |  237  76.59
 ZWEN |     -     -     X    47     -     -     -    41 |  252    >>>
 -----+-------------------------------------------------+--------------
 TOT  |  5437    97    94   113  5316  5149     -   101 |


 BEST CLOCK FIT: ALGO   287   0.03 (ns) 

