
 GPS week: 1088   Day: 5   MJD: 51865                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2581      0    -0.07     0.11     5.61     0.00
 cod |   288     0  17294      2     0.61    -0.98     0.07    28.58
 esa |   288     0  16423    938  1917.57    10.77     0.12    14.05
 gfz |   288     0  14247      0    -0.06    -0.02     0.08    22.67
 igp |    96     0   2393      0    -0.03     0.09     5.71     0.00
 igu |    96     0   2101      0    -0.08     0.09     5.18     0.00
 jpl |    96     0   2567     99    -0.13     0.17     0.12    12.51
 ngs |    96     0   2581      0    -0.07     0.09     5.36     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14175    521  1933.55    10.92     0.08    22.18

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  6793   207    67    75 10324  5452    -6  6118     -  -368 |
    2 | -1348   138  -120  -126  6971  2892   -74 -2365     -    45 |
    3 |  5208  -102   578   191 16935 10711   -76  4605     -  -426 |
    4 |   307   -21   -16  -102 -5388  3861  -346  -212     -   206 |
    5 |  8046   -67   443   -42     -     -    24  7620     -  -166 |
    6 |  8282   -28    21    60  6420  4145  -114  8223     -   -23 |
    7 | -2224   146   -66   -69-50306     -    22 -2106     -   -72 |
    8 |  5755    52  -279   111  9748  2920    85  4549     -   -15 |
    9 |   -28  -126    25   136 11660 -2246   -61   -86     -     9 |
   10 |  3108    58     X  -220 30333  7873   355  1488     -    86 |
   11 |  3752   -46    96   -85 12038  3748   151  3615     -    53 |
   13 |   909    55   -74  -100 11115 -4724   -96   699     -   104 |
   15 | -9307   282     -   -58-16140   679    95 -7635     -  -299 |
   17 | -1181   195     X   -29-15989 -1297   210  -632     -  -249 |
   19 | -7378   113  -260   233 19052     -  -132 -6658     -  -188 |
   20 |  8195   163    34  -274 14133     -   287  7995     -     8 |
   21 | -1200   305   -79   -90 -5080  9242   -14  -481     -  -236 |
   22 |  -159    83   247    95  6856 -8654    83  -134     -  -366 |
   23 |  2097    50  -149     7     --46240   100  1919     -     - |
   24 | -1746     9   117  -209 15604 -1161  -125 -1333     -   152 |
   25 | -5635    34   -48   247 -2489  -232  -122 -4694     -  -241 |
   26 | -1551  -185    51   -51 -8530 -1451     X -1837     -   247 |
   27 |-10414    53  -438   238-76107  4669    -3 -9222     -   -30 |
   28 |  2307     6    41    53 23273     -    98  1864     -  -105 |
   29 |  -831   -69   221    48  2754  2519   -25 -1113     -   -99 |
   30 | -2936   -82   186   154-10088 10532  -174 -2569     -  -148 |
   31 | -8677   103   215    81 -6319 -4569  -134 -7503     -  -320 |
 -----+-------------------------------------------------------------+
 ALGO |     -   -52     X  -118     -     -     -     -     -   188 |
 AREQ |     -   -37    51    15     -     -     -     -     -     - |
 ASC1 |     -     -   -73  -170     -     -     -     -     -   214 |
 AUCK |     -   -87  -114     -     -     -     -     -     -   184 |
 BAHR |     -    95   -63  -122     -     -     -     -     -    42 |
 BOR1 |     -    10   -20     -     -     -     -     -     -     - |
 BRMU |     -   -67    98     -     -     -     -     -     -    23 |
 CAS1 |     -   -63   105   -74     -     -     -     -     -    90 |
 CRO1 |     -   -55   111     -     -     -     -     -     -     - |
 DAV1 |     -   -22     -    28     -     -     -     -     -     - |
 DRAO |     -    21    90  -206     -     -     -     -     -   126 |
 FAIR |     -     -   -93     -     -     -     -     -     -    59 |
 FORT |     -     -   -32     -     -     -     -     -     -    20 |
 GRAZ |     -   -83   169     -     -     -     -     -     -     - |
 HOB2 |     -  -178   138     -     -     -     -     -     -   142 |
 KARR |     -   -18     -    23     -     -     -     -     -     - |
 KIT3 |     -   141  -202   -52     -     -     -     -     -     - |
 KOKB |     -     -   -18    11     -     -     -     -     -     X |
 KWJ1 |     -     -   -61    79     -     -     -     -     -   -39 |
 LHAS |     -   -16    33     -     -     -     -     -     -     - |
 MAC1 |     -    24   158  -121     -     -     -     -     -     - |
 MALI |     -     -  -153     -     -     -     -     -     -    97 |
 MAS1 |     -   -26   -37  -109     -     -     -     -     -   168 |
 MATE |     -  -340     -     -     -     -     -     -     -   438 |
 MCM4 |     -     -  -301   250     -     -     -     -     -   -67 |
 NLIB |     -   -93     -     -     -     -     -     -     -   120 |
 NYA1 |     -    30     -   -38     -     -     -     -     -     - |
 OHIG |     -   -44   324  -109     -     -     -     -     -     - |
 ONSA |     -  -101    39   -28     -     -     -     -     -   133 |
 PIE1 |     -  -105  -178     -     -     -     -     -     -   247 |
 POTS |     -    -8    16     -     -     -     -     -     -     - |
 REYK |     -   -46    94     -     -     -     -     -     -     - |
 SANT |     -     -  -111    69     -     -     -     -     -     X |
 STJO |     -   -70     -    89     -     -     -     -     -     - |
 THU1 |     -   -99     -     -     -     -     -     -     -   128 |
 TIXI |     -    57     -   -72     -     -     -     -     -     - |
 TRO1 |     -  -168     -   212     -     -     -     -     -     - |
 TSKB |     -    79  -271     -     -     -     -     -     -    70 |
 USNO |     -    18  -267     -     -     -     -     -     -   146 |
 USUD |     -    62  -125     -     -     -     -     -     -     - |
 WHIT |     -    40     -   -51     -     -     -     -     -     - |
 WTZR |     -   -81   -31     -     -     -     -     -     -   124 |
 WUHN |     -  -158     -   125     -     -     -     -     -    76 |
 YELL |     -    38  -146    42     -     -     -     -     -     - |
 ZWEN |     -     -    97     -     -     -     -     -     -   -62 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6743   144   106   111  6000  4036   144  6368     -   141 |  288   3.69
    2 |  6990    62    69   117  2647  2276   181  6032     -    43 |  288   2.41
    3 |  4223    62   115    28  6259  7014   198  4130     -    70 |  288   1.42
    4 |  2953    76    98    39  3070  1690    92  2261     -    98 |  288   1.47
    5 |  6606    77   106    41     -     -    68  6202     -    28 |  288   3.70
    6 |  9535    55    61    61 10974  6790    91  9632     -    43 |  288   8.87
    7 |  1564    90   136    75 13214     -    65  1771     -    73 |  288   1.53
    8 |  5557    72    30    72  3393  1766    45  5440     -    47 |  288   3.38
    9 |  2405   126    40    88  2110  1627   140  2304     -    79 |  288   1.63
   10 |  7142   137     X   109  6336  2514   112  6358     -    67 |  277   2.45
   11 |   726    51   242    50  2017  1071   159   654     -   180 |  288   0.44
   13 |  1594    53   117    89  1632  3699    77  1401     -   193 |  288   0.17
   15 |  5585    57     -    53  4173  4646    67  4393     -    36 |  288   3.08
   17 |  9564   107     X   126  6704  8141   151  8881     -    55 |  288   6.84
   19 | 10813    69    94    49  4987     -    72 10317     -    71 |  288   2.54
   20 |  1620    82   125    72  2138     -   128  1424     -    55 |  288   0.34
   21 |  3129   174   434   176  2806  4674   237  3398     -   219 |  276   2.24
   22 |  1725   129    61    83  3551  6899    70  1658     -    66 |  288   0.53
   23 |  5881    67   389   175     - 14002   171  6007     -     - |  277   6.21
   24 |  4911   100    78   115  4601  1933    81  4834     -   101 |  288   1.61
   25 |  6279    47    67    89  3409  3385    65  7174     -    68 |  288   2.86
   26 |  2143   103    35    89  3419  2670     X  2191     -    56 |  288   0.43
   27 |  5944    66    63    66 12326  3077    42  5518     -   111 |  288   2.33
   28 |  5456    76    96   100  1932     -   132  5026     -    40 |  288   1.55
   29 |  2467    91    40   156  2868  1067    94  2274     -    62 |  288   0.70
   30 |  3832    66    57    45  3251  5097   180  3828     -    35 |  288   1.60
   31 |  8235    67    79    35  6437  6588    90  7739     -    54 |  288   5.69
 -----+-------------------------------------------------------------+--------------
 ALGO |     -    68     X    76     -     -     -     -     -    24 |  287   0.03
 AREQ |     -    37    38    34     -     -     -     -     -     - |  288  35.43
 ASC1 |     -     -    56    27     -     -     -     -     -    26 |  181    >>>
 AUCK |     -    47    56     -     -     -     -     -     -    45 |  288  18.39
 BAHR |     -    59    67    37     -     -     -     -     -    72 |  288   0.44
 BOR1 |     -    20    40     -     -     -     -     -     -     - |  287   3.10
 BRMU |     -    36    30     -     -     -     -     -     -    36 |  288  18.86
 CAS1 |     -    51    58    74     -     -     -     -     -    39 |  288  11.06
 CRO1 |     -    19    39     -     -     -     -     -     -     - |  285   0.24
 DAV1 |     -    65     -    82     -     -     -     -     -     - |  218  18.47
 DRAO |     -    40   190    84     -     -     -     -     -    27 |  286  55.20
 FAIR |     -     -   156     -     -     -     -     -     -    99 |  285   0.10
 FORT |     -     -   136     -     -     -     -     -     -    86 |  119   0.63
 GRAZ |     -    18    37     -     -     -     -     -     -     - |  220  40.48
 HOB2 |     -    23    32     -     -     -     -     -     -    32 |  288   0.05
 KARR |     -    72     -    91     -     -     -     -     -     - |  288 108.91
 KIT3 |     -    31    38    44     -     -     -     -     -     - |  288  22.93
 KOKB |     -     -   144    89     -     -     -     -     -     X |  274   0.57
 KWJ1 |     -     -   161   133     -     -     -     -     -   115 |  230  90.02
 LHAS |     -    39    79     -     -     -     -     -     -     - |  287  20.90
 MAC1 |     -    56   204    79     -     -     -     -     -     - |  270  12.95
 MALI |     -     -   204     -     -     -     -     -     -   129 |  265  15.56
 MAS1 |     -    40    92    33     -     -     -     -     -    30 |  288   1.51
 MATE |     -    26     -     -     -     -     -     -     -    33 |  168   0.09
 MCM4 |     -     -    39    44     -     -     -     -     -    58 |  286  34.81
 NLIB |     -    67     -     -     -     -     -     -     -    86 |  286   0.06
 NYA1 |     -    18     -    22     -     -     -     -     -     - |  288   0.12
 OHIG |     -    29    53    43     -     -     -     -     -     - |  284  19.80
 ONSA |     -    32    60    49     -     -     -     -     -    29 |  288  13.19
 PIE1 |     -    57    43     -     -     -     -     -     -    53 |  288   0.12
 POTS |     -    30    62     -     -     -     -     -     -     - |  288  15.58
 REYK |     -    41    83     -     -     -     -     -     -     - |  288   7.36
 SANT |     -     -    58    36     -     -     -     -     -     X |  219  15.49
 STJO |     -    32     -    41     -     -     -     -     -     - |  288   3.04
 THU1 |     -    36     -     -     -     -     -     -     -    46 |  277  14.22
 TIXI |     -    25     -    32     -     -     -     -     -     - |  287  12.59
 TRO1 |     -    19     -    24     -     -     -     -     -     - |  288  10.09
 TSKB |     -    89   141     -     -     -     -     -     -    42 |  288   1.29
 USNO |     -    40    36     -     -     -     -     -     -    34 |  288   0.03
 USUD |     -    33    67     -     -     -     -     -     -     - |  287   0.48
 WHIT |     -    21     -    27     -     -     -     -     -     - |  288  26.56
 WTZR |     -    62   166     -     -     -     -     -     -    40 |  288   0.14
 WUHN |     -    57     -   108     -     -     -     -     -    78 |  286  32.55
 YELL |     -    24   104    76     -     -     -     -     -     - |  288   0.03
 ZWEN |     -     -    82     -     -     -     -     -     -    52 |  100 368.86
 -----+-------------------------------------------------------------+--------------
 TOT  |  5615    68   121    81  5707  5177   123  5358     -    81 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

