
 GPS week: 1088   Day: 0   MJD: 51860                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2572      0    -0.06    -0.01     4.42     0.00
 cod |   288     0  15602      4    -1.45    -2.23     0.08    38.98
 gfz |   288     0  13655      0     0.23    -0.52     0.12    27.00
 igp |    96     0   2385      0    -0.08     0.13     5.51     0.00
 igu |    96     0   2193      0    -0.05     0.00     4.16     0.00
 ngs |    96     0   2572      0    -0.07    -0.01     4.34     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  13844    269  1884.53     7.27     0.09    34.02

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   gfz   igp   igu   ngs   sio   usn |
 -----+-------------------------------------------------+
    1 | -4248   184    78   584 -1525 -4193     -  -272 |
    2 | -3911   184   -72 12780 -7165 -4598     -  -152 |
    3 | -1676   -58   107-13480  -591 -1282     -   -20 |
    4 |  2643    57    36-13064 -3011  2292     -   -94 |
    5 |  2376    20    33 21158-13224  1922     -   -49 |
    6 |  7117     2    19   -73 12242  7037     -   -17 |
    7 | -4242   175   -78-40386 -1012 -3832     -  -130 |
    8 |  5264   212   -50-11110  -380  4168     -  -203 |
    9 |   414   -27   140 11811  7456   367     -   -81 |
   10 |  1855   123  -124 41957  -737  1507     -   -42 |
   11 |  3473   -25   -42 18168    25  3578     -    62 |
   13 |  4625    15    70 12299  2049  4454     -   -73 |
   15 |  6647   118   -46     -     -  5592     -   -98 |
   17 |   137    73   -43-10187  -737  -855     -   -49 |
   19 |-17022   144   187-77885     --12771     -  -314 |
   20 |  6918   120  -211  9805  -235  6284     -    23 |
   21 |   740    50    12 33724-15590   408     -   -67 |
   22 |  1603   -29    42-12385  1604  1271     -     X |
   23 | -6462    -6     8     -     - -5606     -     - |
   24 | -6433   185  -175 23595     - -5578     -   -62 |
   25 | -4191    15   264 -9116  3520 -3873     -  -227 |
   26 |   967   -55   117-10426 -6621   619     -   -31 |
   27 | -3153   138    95-20796   358 -3424     -  -234 |
   28 |  2820   -35    64 18534  3936  2963     -    -8 |
   29 |  -792   -55    88 -2763  2670  -898     -    -8 |
   30 |  -993   -79   198   890 14561  -956     -   -61 |
   31 |  5379   -13   214 18715  1777  5290     -  -156 |
 -----+-------------------------------------------------+
 ALGO |     -   -78   -69     -     -     -     -   144 |
 AREQ |     -   -77     -     -     -     -     -    88 |
 AUCK |     -   -43     -     -     -     -     -    50 |
 CAS1 |     -   -73   -45     -     -     -     -   119 |
 DAEJ |     -  -576     -     -     -     -     -   660 |
 DAV1 |     -    25   -36     -     -     -     -     - |
 DRAO |     -    -5  -126     -     -     -     -   105 |
 GALA |     -   -71     5     -     -     -     -    77 |
 GUAM |     -  -130     -     -     -     -     -   149 |
 HOB2 |     -  -135     -     -     -     -     -   155 |
 KIT3 |     -   112  -162     -     -     -     -     - |
 KOKB |     -     -  -112     -     -     -     -    89 |
 KWJ1 |     -     -   -36     -     -     -     -    29 |
 LHAS |     -    47   -68     -     -     -     -     - |
 MAC1 |     -    47   -67     -     -     -     -     - |
 MAS1 |     -   -34  -102     -     -     -     -   119 |
 MATE |     -  -115     -     -     -     -     -   131 |
 MCM4 |     -     -  -130     -     -     -     -   103 |
 NYA1 |     -    -2     3     -     -     -     -     - |
 OHIG |     -    59   -85     -     -     -     -     - |
 ONSA |     -   -95     -     -     -     -     -   109 |
 PIE1 |     -  -202     -     -     -     -     -   231 |
 SANT |     -     -   133     -     -     -     -  -105 |
 STJO |     -   -16    23     -     -     -     -     - |
 SUTH |     -     -   115     -     -     -     -   -92 |
 TIDB |     -    63   -90     -     -     -     -     - |
 TRO1 |     -  -102   148     -     -     -     -     - |
 TSKB |     -   -30     -     -     -     -     -    35 |
 URUM |     -  -147     -     -     -     -     -   168 |
 USNO |     -  -131     -     -     -     -     -   150 |
 WHIT |     -   -38    55     -     -     -     -     - |
 WSRT |     -   -43     -     -     -     -     -    50 |
 WTZR |     -  -116     -     -     -     -     -   133 |
 YSSK |     -    72  -105     -     -     -     -     - |
 ZWEN |     -     -  -174     -     -     -     -   138 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   gfz   igp   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  2140    64    52  1814  1746  2289     -    39 |  288   1.72
    2 |  8061    63    84  3378  6737  7989     -    78 |  288   2.65
    3 |  4055    46    76  3021  2508  4182     -    39 |  288   2.70
    4 |  1102    62    52  3579  1975   907     -    61 |  288   0.90
    5 |  4370    65    59  5244  7284  4916     -    39 |  288   4.01
    6 |  7998    92   137  9000  8291  7907     -    44 |  288   7.05
    7 |  3561    81   136 11174  1542  3383     -    60 |  288   1.35
    8 |  7211   108   162  3962  1824  7229     -    37 |  288   3.28
    9 |  4194    60    59  5280  4228  4212     -    26 |  288   1.88
   10 |  2338   142    66  6245  1792  2034     -   155 |  277   2.06
   11 |   511   112    82  3697   628   529     -    68 |  288   0.38
   13 |   790    30    56  1881   736   808     -    42 |  288   0.20
   15 |  4906    82    71     -     -  4591     -    72 |  288   3.01
   17 |  6489    71   102  3261  3803  5552     -    84 |  288   3.43
   19 |  8024    29   107 16448     -  7613     -    97 |  288   2.49
   20 |  3322    59    71  1081   521  2743     -    57 |  288   0.21
   21 |  4382    83    64  2609  8975  4532     -    58 |  277   2.32
   22 |  2181    56    81  3049  1254  2315     -     X |  269   0.76
   23 |  5497   148   213     -     -  6391     -     - |  268   5.47
   24 |  4427   346   243  3472     -  4307     -   194 |  288   1.33
   25 |  2038    44    78  3101  3603  2427     -    39 |  288   1.73
   26 |   944    85    77  2805  2886  1128     -    77 |  288   0.43
   27 |  1916    60   180  1865  2682  1891     -    92 |  288   1.91
   28 |  1200    36    53   728  3208  1347     -    28 |  288   0.52
   29 |  1150    61    56  2767  1492  1239     -    78 |  288   0.80
   30 |  5639    64   103  5717  7068  4827     -    33 |  288   1.67
   31 |  3785    52    81  4679  2727  3750     -    30 |  288   3.17
 -----+-------------------------------------------------+--------------
 ALGO |     -    15    45     -     -     -     -    41 |  288   0.02
 AREQ |     -    41     -     -     -     -     -    47 |  288  49.35
 AUCK |     -    45     -     -     -     -     -    51 |  287  19.84
 CAS1 |     -    33    80     -     -     -     -    74 |  288  11.94
 DAEJ |     -    18     -     -     -     -     -    21 |   85   1.05
 DAV1 |     -    26    37     -     -     -     -     - |  202  14.91
 DRAO |     -    30    46     -     -     -     -    29 |  287  24.21
 GALA |     -    37    44     -     -     -     -    28 |  288  38.17
 GUAM |     -    30     -     -     -     -     -    35 |  280  28.43
 HOB2 |     -    45     -     -     -     -     -    52 |  288   0.21
 KIT3 |     -    59    85     -     -     -     -     - |  287  21.13
 KOKB |     -     -   275     -     -     -     -   218 |  257   0.39
 KWJ1 |     -     -   143     -     -     -     -   113 |  226    >>>
 LHAS |     -    51    74     -     -     -     -     - |  287  16.88
 MAC1 |     -    32    47     -     -     -     -     - |  281  12.28
 MAS1 |     -    46    39     -     -     -     -    56 |  288   2.08
 MATE |     -    47     -     -     -     -     -    54 |  286   0.07
 MCM4 |     -     -   340     -     -     -     -   270 |  254  48.79
 NYA1 |     -    41    59     -     -     -     -     - |  288   0.19
 OHIG |     -    54    78     -     -     -     -     - |  287  16.85
 ONSA |     -    32     -     -     -     -     -    37 |  287  14.02
 PIE1 |     -    33     -     -     -     -     -    38 |  286   0.09
 SANT |     -     -   320     -     -     -     -   254 |  195  13.79
 STJO |     -    38    55     -     -     -     -     - |  287   3.35
 SUTH |     -     -   106     -     -     -     -    84 |  263  29.80
 TIDB |     -    25    36     -     -     -     -     - |  287   0.05
 TRO1 |     -    40    58     -     -     -     -     - |  279  10.46
 TSKB |     -    49     -     -     -     -     -    56 |  265   2.08
 URUM |     -    32     -     -     -     -     -    37 |  280 140.10
 USNO |     -   119     -     -     -     -     -   136 |  273  76.82
 WHIT |     -    14    20     -     -     -     -     - |  287   6.63
 WSRT |     -    28     -     -     -     -     -    32 |  287   0.07
 WTZR |     -    48     -     -     -     -     -    55 |  288   0.20
 YSSK |     -    50    73     -     -     -     -     - |  287  18.28
 ZWEN |     -     -    40     -     -     -     -    32 |  288  16.29
 -----+-------------------------------------------------+--------------
 TOT  |  4420    77   115  5507  4161  4345     -    88 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

