
 GPS week: 1087   Day: 2   MJD: 51853                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2562      0     0.11    -0.18     5.08     0.00
 cod |   287     0  16296      0     1.00    -3.45     0.07    36.56
 gfz |   288     0  14120      9    -1.06     0.75     0.10    29.41
 igp |    96     0   2471      0     0.04    -0.03     5.77     0.00
 igr |    96     0   2562      0     0.03    -0.10     0.06     0.00
 igu |    96     0   1712      0     0.12    -0.26     5.45     0.00
 ngs |    96     0   2562      0     0.12    -0.18     4.87     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14333    860  1852.68     7.66     0.08    34.03

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   gfz   igp   igr   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  1913   257    95   298    40 -5033  1138     -  -351 |
    2 |  2433    91   -86  7501    -2 -1167  1818     -   -29 |
    3 | -3325   -83   184 -2409   -22  6886 -2647     -   -79 |
    4 | -3201  -103    69-11091    -7     - -3697     -    49 |
    5 | -1889   -31   -76 27616   -17     - -1300     -    99 |
    6 | -7789  -100   137 -8246     1 -7919 -7665     -   -12 |
    7 |  -945   137   -87-14823     3  1823 -1536     -   -70 |
    8 | -4650   182  -155-34325     0-19165 -4471     -   -61 |
    9 | -2969   -51    63  -853    -9     - -2546     -     X |
   10 |  1353    65  -155 -2792   -15     -  1397     -    66 |
   11 |  -962    44    45 -2875     7  -364  -264     -   -86 |
   13 |  2808    41    88-11137    13 -1092  2810     -  -119 |
   15 |  3523   241   -31 15527    22 16550  3066     -  -232 |
   17 |  6039    94   -81 26117     3  9108  5152     -   -32 |
   19 |  7694   203   111 15208    35     -  4756     -  -314 |
   20 |  6827    82   -98   115    -5  -218  6670     -    -5 |
   21 | -6431    44   -55 16956   -25     - -5073     -     X |
   22 |  -389    69   -85  6905  -113  7501  -210     -     X |
   23 |   699    -2     1     -    -1 -9338   618     -     - |
   24 |  -577  -106     2-25495   -18  6878   991     -   112 |
   25 |   271   -55   406   157    39     -   441     -  -292 |
   26 | -2215  -255   141-13871   -19 -2736 -1843     -   151 |
   27 | -7749   154    11 -2552    16     - -7584     -  -173 |
   28 |  5054    26   118 11853    14  7920  5629     -  -126 |
   29 |  -320   -63   151-12031     7 -5574   -99     -   -64 |
   30 |  1610   -45   183 13693    12 -3905  1002     -  -111 |
   31 |  2817   137   159  3450    33     -  3132     -  -284 |
 -----+-------------------------------------------------------+
 ALGO |     -  -117   -71     -     -     -     -     -   187 |
 ASC1 |     -     -  -369     -     -     -     -     -   319 |
 AUCK |     -   -70     -     -     -     -     -     -    75 |
 BAHR |     -   -30   -29     -     -     -     -     -    57 |
 CAS1 |     -   -68   -17     -     -     -     -     -    87 |
 DRAO |     -   -35  -148     -     -     -     -     -   165 |
 GALA |     -     -  -105     -     -     -     -     -    90 |
 GUAM |     -   259     -     -     -     -     -     -  -278 |
 HOB2 |     -   -46     -     -     -     -     -     -    49 |
 HRAO |     -  -121     -     -     -     -     -     -   130 |
 KARR |     -    -4     5     -     -     -     -     -     - |
 KOUR |     -   -92     -     -     -     -     -     -    99 |
 LPGS |     -  -135   168     -     -     -     -     -     - |
 MAC1 |     -    -3     4     -     -     -     -     -     - |
 MATE |     -   -74     -     -     -     -     -     -    80 |
 MAW1 |     -   -34    42     -     -     -     -     -     - |
 MCM4 |     -   108     2     -     -     -     -     -  -114 |
 NYA1 |     -    16   -20     -     -     -     -     -     - |
 OHIG |     -    17   -21     -     -     -     -     -     - |
 ONSA |     -   -77     -     -     -     -     -     -    82 |
 PIE1 |     -  -138     -     -     -     -     -     -   148 |
 RBAY |     -   -48    60     -     -     -     -     -     - |
 SANT |     -     -   138     -     -     -     -     -  -119 |
 STJO |     -    61   -76     -     -     -     -     -     - |
 SUTH |     -   240  -264     -     -     -     -     -   -28 |
 THU1 |     -  -102     -     -     -     -     -     -   110 |
 TIDB |     -    67   -83     -     -     -     -     -     - |
 TRO1 |     -  -137   170     -     -     -     -     -     - |
 URUM |     -     -  -103     -     -     -     -     -    89 |
 USNO |     -  -163     -     -     -     -     -     -   175 |
 WHIT |     -   -59    73     -     -     -     -     -     - |
 WSRT |     -   -35     -     -     -     -     -     -    38 |
 WTZR |     -   -67     -     -     -     -     -     -    71 |
 WUHN |     -   -84  -192     -     -     -     -     -   256 |
 YAR2 |     -   -21     -     -     -     -     -     -    23 |
 YSSK |     -     6    -7     -     -     -     -     -     - |
 ZWEN |     -     -   -78     -     -     -     -     -    67 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   gfz   igp   igr   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6632    47    39  3014    26  3544  6149     -    25 |  288   2.67
    2 |  2391    55    39  4391    16  1675  3017     -    44 |  288   2.13
    3 |  2683    90   220  2124    79  2277  3000     -   280 |  287   2.23
    4 |  5758   113    80  7286    22     -  5121     -    63 |  288   0.92
    5 |  7321    66    86  3235    12     -  6656     -    47 |  277   2.74
    6 |  8145    79   132  8091    17  7335  8230     -    77 |  288   8.47
    7 |  5165    82    53  8905    12  1339  4600     -    49 |  288   1.49
    8 |  3940    49    60 11392    21 10001  3955     -    58 |  288   2.79
    9 |  2288    71    89  1769   159     -  1727     -     X |  284   1.36
   10 |  2434    70    85  2480    13     -  2477     -    39 |  277   1.73
   11 |  2113   100    89  2080    10  1518  1918     -    95 |  288   0.35
   13 |   975    45    56  1688    10  1634  1087     -    23 |  288   0.32
   15 |  3072    96    52  3815    13  3163  2462     -    94 |  287   2.82
   17 |  9679    69   182 14353    43 14643  9963     -   128 |  288   4.43
   19 |  7930    46    64 12910    11     -  7544     -    39 |  287   4.69
   20 |  1379    57   135  1274    23  1950  1077     -    82 |  288   0.31
   21 |  6554    93   116  3196   169     -  5428     -     X |  275   3.36
   22 |  1487   193   240   731   160  5315  1340     -     X |  275   0.55
   23 |  5530   104   132     -    75  2982  5677     -     - |  275   6.13
   24 | 10533    72    58  1590     8  3687  9803     -    58 |  287   1.49
   25 |  1697    35    35  2158    12     -  1856     -    34 |  288   1.82
   26 |  1654    71    36  2923    20  3050  1410     -    90 |  288   0.47
   27 |  5510    89   144  4813    21     -  5692     -    55 |  288   3.36
   28 |  4775    65   108  1611    16  7013  4357     -   137 |  288   0.88
   29 |   778    69    57  4164    14  3770   688     -    98 |  288   0.59
   30 |  3916   144   156  4220    13  2292  3997     -    47 |  278   1.43
   31 |  2724    59    60  2394     9     -  2688     -    41 |  288   2.29
 -----+-------------------------------------------------------+--------------
 ALGO |     -    53    36     -     -     -     -     -    44 |  288   0.03
 ASC1 |     -     -    21     -     -     -     -     -    18 |  288    >>>
 AUCK |     -   114     -     -     -     -     -     -   122 |  287  20.91
 BAHR |     -    58    66     -     -     -     -     -   108 |  288   0.52
 CAS1 |     -    25    24     -     -     -     -     -    37 |  286  10.87
 DRAO |     -    90    90     -     -     -     -     -   166 |  285  36.89
 GALA |     -     -    79     -     -     -     -     -    68 |  288  28.50
 GUAM |     -    80     -     -     -     -     -     -    86 |  185  35.02
 HOB2 |     -    68     -     -     -     -     -     -    73 |  287   0.06
 HRAO |     -    78     -     -     -     -     -     -    83 |  287    >>>
 KARR |     -    80   100     -     -     -     -     -     - |  287 121.78
 KOUR |     -    33     -     -     -     -     -     -    36 |  274   4.67
 LPGS |     -    22    28     -     -     -     -     -     - |   80  84.02
 MAC1 |     -    64    80     -     -     -     -     -     - |  232  15.71
 MATE |     -    22     -     -     -     -     -     -    24 |  287   0.15
 MAW1 |     -    30    37     -     -     -     -     -     - |  281  26.95
 MCM4 |     -   120   122     -     -     -     -     -    99 |  287  12.64
 NYA1 |     -    18    22     -     -     -     -     -     - |  274   0.07
 OHIG |     -    29    36     -     -     -     -     -     - |  286  31.32
 ONSA |     -    52     -     -     -     -     -     -    55 |  287  10.04
 PIE1 |     -    51     -     -     -     -     -     -    55 |  257   0.08
 RBAY |     -    38    47     -     -     -     -     -     - |  262  68.15
 SANT |     -     -   179     -     -     -     -     -   155 |  223   4.93
 STJO |     -    28    35     -     -     -     -     -     - |  287   3.56
 SUTH |     -    93    51     -     -     -     -     -    61 |  288  22.32
 THU1 |     -    47     -     -     -     -     -     -    51 |  279  14.39
 TIDB |     -    84   104     -     -     -     -     -     - |  287   0.25
 TRO1 |     -   103   128     -     -     -     -     -     - |  273  11.12
 URUM |     -     -    13     -     -     -     -     -    11 |  288  72.14
 USNO |     -    65     -     -     -     -     -     -    70 |  287   0.03
 WHIT |     -    95   118     -     -     -     -     -     - |  271  20.41
 WSRT |     -    50     -     -     -     -     -     -    54 |  287   0.05
 WTZR |     -    27     -     -     -     -     -     -    30 |  287   0.08
 WUHN |     -    54    48     -     -     -     -     -    37 |  287  17.43
 YAR2 |     -    44     -     -     -     -     -     -    48 |  272 185.95
 YSSK |     -    38    47     -     -     -     -     -     - |  279  15.83
 ZWEN |     -     -    27     -     -     -     -     -    24 |  277  17.28
 -----+-------------------------------------------------------+--------------
 TOT  |  5082    75    96  5769    59  5452  4874     -    82 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

