2005 2005.5 2006 2006.5 2007 2007.5 2008

-150

-100 -50 0 50 100 slbu:east un-filtered (mm) wrms = 28.04 mm

years

2005 2005.5 2006 2006.5 2007 2007.5 2008

-150

-100 -50 0 50 100 wrms = 26.90 mm

years filtered (mm)