2005 2005.5 2006 2006.5 2007 2007.5 2008 2008.5 -30 -20 -10 0 10 20 30 40 prkb:up un-filtered (mm) wrms = 8.40 mm

years

2005 2005.5 2006 2006.5 2007 2007.5 2008 2008.5 -30 -20 -10 0 10 20 30 40 wrms = 7.23 mm

years filtered (mm)