2004.62 2004.64 2004.66 2004.68 2004.7 2004.72 2004.74 2004.76 2004.78 -30 -20 -10 0 10 20 30 slbu:up un-filtered (mm) wrms = 9.11 mm

years

2004.62 2004.64 2004.66 2004.68 2004.7 2004.72 2004.74 2004.76 2004.78 -30 -20 -10 0 10 20 30 wrms = 8.32 mm

years filtered (mm)