2004.62 2004.64 2004.66 2004.68 2004.7 2004.72 2004.74 2004.76 2004.78

-5

0

5 slbu:north un-filtered (mm) wrms = 2.92 mm

years

2004.62 2004.64 2004.66 2004.68 2004.7 2004.72 2004.74 2004.76 2004.78

-5

0

5 wrms = 2.77 mm

years filtered (mm)