2004.7 2004.75 2004.8 2004.85 2004.9 2004.95 -20 -15 -10 -5 0 5 10 15 abgs:up un-filtered (mm) wrms = 6.02 mm

years

2004.7 2004.75 2004.8 2004.85 2004.9 2004.95 -20 -15 -10 -5 0 5 10 15 wrms = 4.25 mm

years filtered (mm)